\begin{table}%t3
%\centering
\par
\caption {\label{model_fs}PDR model fit to the observed atomic fine structure line integrated intensities in IRS1.} 
\begin{tabular}{lcccc}
\hline\hline
\noalign{\smallskip}
Species & Total &hot &Cool & Obs. \\
 & (K km~s$^{-1}$) & (K km~s$^{-1}$) & (K km~s$^{-1}$) & (K km~s$^{-1}$) \\
 \hline
\CII &19.3--21.9 & 16.5  & 2.8--5.4  &  37.\\
\CI(1--0) & 9.7--11.0 & 1.5  & 8.2--9.5 &  11.4 \\
\CI(2--1) & 6.9--8.5  &  1.7  & 5.2--6.8 & 20.5 \\
\hline		
\end{tabular}
\tablefoot{
Shown are the ranges spanned by the two fits.}
\vspace*{-6mm}
\end{table}