\begin{table}%t2
\caption{\label{bvmag}Sample of the table of $BV$ photometry of V711~Tau.}
\par
%\centering
\par
\begin{tabular}{lrrlrrlrrlrr}
\hline \hline \noalign{\smallskip}
JD & & & JD & & & JD & & & JD &&\\
2~400~000+ & $\Delta V$ & $\Delta (B-V)$ & 2~400~000+ & $\Delta V$ &
$\Delta (B-V)$ & 2~400~000+ & $\Delta V$ & $\Delta (B-V)$ & 2~400~000+
& $\Delta V$ & $\Delta (B-V)$ \\
\hline
  49~012.083 & 1.563 & 0.323 &  52~329.143 & 1.496 & 0.323 &  53~049.106 & 1.563 & 0.406 &  54~152.084 & 1.642 & 0.336 \\
  49~014.156 & 1.599 & 0.370 &  52~330.131 & 1.487 & 0.384 &  53~055.098 & 1.613 & 0.367 &  54~153.106 & 1.602 & 0.336 \\
\hline
\end{tabular}
\end{table}