\begin{table}
        \caption{\label{tabdedica2d}Substructure from the photometric sample detected with DEDICA.}
\centering
         \begin{tabular}{l r c c c }
            \hline
            \hline
            \noalign{\smallskip}
Subclump & $N_{\rm S}$ & $\alpha,\,\delta$ & $\rho_{\rm S}$ & $\chi^2_{\rm S}$\\
&&(J2000)&&\\
        \hline
         \noalign{\smallskip}
${\rm 2D{-}E}$ &106&212718.4--121009&1.000&35.0\\
${\rm 2D{-}NW}$ & 99&212653.1--120815&0.887&30.0\\
${\rm 2D{-}SW}$ & 86&212659.9--121107&0.876&24.4\\
${\rm 2D{-}N}$\tablefootmark{a} & 86&212705.7--120322&0.655&25.9\\
            \hline
         \end{tabular}
\tablefoot {\tablefootmark{a}{This subclump is NOT confirmed by the VTP analysis.}}
\vspace*{-6mm}
       \end{table}