\begin{table}%t2
\caption{\label{chandraobs2}Individual periods and TOAs of the observations of \rxj\ as listed in Table~\ref{chandraobs}.}
\begin{tabular}{rlllll}
\hline\hline\noalign{\smallskip}
Obs. Id. & Instrument/setup & Period & Period & TOA & TOA          \\
&                  	 &    (120--400~eV)        &         (400--1000~eV)             & (120--400~eV)     & (400--1000~eV) \\     
&                    & 	[s]		  &		[s]		      & [days]&     [days]          \\
\hline
rp300338n00 & PSPC  & \multicolumn{2}{c}{8.39120(44)}  & 49~257.2547153(16)  &   49~257.2547298(21)  \\
%rh201733n00 	& HRI          	 &            							& &    \\  
rh300508n00 	& HRI          	 & \multicolumn{2}{c}{8.3852(63)}     				& 50~198.6873383(25)  &   50~198.6873509(35) \\ 
rh180100n00 	& HRI          	 & \multicolumn{2}{c}{8.3443(11)}     				& 50~210.5562791(18)  &   50~210.5562812(17)  \\
rh300508n01 	& HRI          	 & \multicolumn{2}{c}{8.4902(98)}     				& 50~353.9975633(27)  &   50~353.9975702(20)  \\ 
rh400884n00 	& HRI          	 & \multicolumn{2}{c}{8.391130(50)}   				& 50~391.3004644(14)  &   50~391.3004729(18)  \\
h400944n00 	& HRI          	 & \multicolumn{2}{c}{8.3921(10)}     				  & 50~925.6878393(11)  &   50~925.6878472(21)  \\   
368$^{1}$     	& HRC-S/LETG    	 & \multicolumn{2}{c}{8.39063(49)}    				& 51~577.0395641(21)  &   51~577.0395693(16)  \\
745$^{1}$     	& HRC-S/LETG    	 & \multicolumn{2}{c}{}					&  &    \\
369$^{1}$     	& HRC-S/LETG    	 & \multicolumn{2}{c}{} 					&  &    \\     
0078 S3		& EPIC-pn/FF thin	 &       		8.391113(18)	& 8.391085(35)  	& 51~677.44324000(30) &   51~677.44323979(69) \\  
S1		& EPIC-MOS1/FF thin	 &       		8.391090(45)	& 8.391090(55)  	& 51~677.47179274(83) &   51~677.47179286(78) \\  
S2		& EPIC-MOS2/SW thin 	 &    		   	8.391113(23)	& 8.391033(53)  	& 51~677.47179234(54) &   51~677.4717923(13)  \\
0175 S3		& EPIC-pn/FF med & 			8.391268(58)    & 8.39124(12)  	 	& 51~869.95710586(60) &   51~869.95710803(84) \\ 
S7		& EPIC-MOS1/LW med & 			8.39122(22)     & 8.39107(32)  	 	& 51~869.9949836(13)  &   51~869.9949874(27)  \\  
2774$^{2}$   	& ACIS-CC         	 &			8.391093(13)	& 8.391133(13)   	& 52~248.6767290(15)  &   52~248.67672069(69) \\ 
2773$^{2}$   	& ACIS-CC          	 &					& 		   	&  &    \\ 
2771$^{2}$ 	& ACIS-CC         	 &					& 		   	&  &    \\ 
2772$^{2}$ 	& ACIS-CC         	 &					& 		   	&  &    \\ 
0533 S3 & EPIC-pn/FF thin	 & 			8.391143(43)	& 8.391098(73)  & 52~584.92605120(69) &   52~584.9260530(10)  \\
S1	& EPIC-MOS1/FF thin	 & 			8.39136(12) 	& 8.39088(16)		& 52~584.91993465(11) &   52~584.9200294(15)  \\   
S2	& EPIC-MOS2/FF thin	 & 			8.39122(12) 	& 8.39104(20)		& 52~584.91993465(95) &   52~584.9199325(16)  \\
0534 S3	& EPIC-pn/FF thin	 & 			8.391225(40)	& 8.391317(63)  & 52~587.00129529(39) &   52~587.00129506(97) \\ 
S1	& EPIC-MOS1/FF thin	 & 			8.39119(11) 	& 8.39116(18)		& 52~586.9952779(18)  &   52~586.9952766(29)  \\
S2	& EPIC-MOS2/FF thin	 & 			8.39137(13) 	& 8.39137(23)		& 52~586.99527264(93) &   52~586.9952735(14)  \\
0622 U2	& EPIC-pn/SW thick	 & 			8.391133(18)	& 8.391138(23)  & 52~761.99514720(82) &   52~761.99514812(64) \\
S5	& EPIC-MOS1/FF med & 			8.39130(16) 	& 8.39100(20)		& 52~762.2413478(13)  &   52~762.2413532(20)  \\
S3	& EPIC-MOS1/FF thin	 & 			8.39101(13) 	& 8.39100(17)		& 52~761.8668566(19)  &   52~761.8668516(28)  \\
S6	& EPIC-MOS2/FF med & 			8.39100(15) 	& 8.39126(15)		& 52~762.2413439(17)  &   52~762.24144068(14) \\
S4	& EPIC-MOS2/FF thin	 & 			8.390950(95)	& 8.39118(21)		& 52~761.8669520(11)  &   52~761.8669491(20)  \\
0711 S8	& EPIC-pn/SW med & 			8.391082(48)	& 8.391188(82)  & 52~940.11635982(97) &   52~940.11627407(69) \\  
S3	& EPIC-MOS1/FF thin	 & 			8.39125(31) 	& 8.39077(52)		& 52~939.99012307(84) &   52~939.9900211(20)  \\   
S5	& EPIC-MOS1/LW thin	 & 			8.39087(24) 	& 8.39059(41)		& 52~940.1679353(12)  &   52~940.1679433(29)  \\ 
S4	& EPIC-MOS2/FF thin	 & 			8.39169(32) 	& 8.39051(49)		& 52~939.9900070(17)  &   52~939.9900222(24)  \\  
S6	& EPIC-MOS2/LW thin	 & 			8.39091(22) 	& 8.39147(26)		& 52~940.1679318(13)  &   52~940.1679407(14)  \\
4666$^{3}$      & ACIS-CC          	 & 			8.3911142(23)	& 8.3911216(28)& 53~016.68131016(91) &   53,016.6813159(12) \\ 	
4667$^{3}$      & ACIS-CC & & 	&  &    \\
4668$^{3}$      & ACIS-CC   & & &  &    \\
4669$^{3}$      & ACIS-CC & & &  &    \\
5305$^{4}$	& HRC-S/LETG & \multicolumn{2}{c}{8.39109(25)}				& 53~062.4157092(15)  &   53~062.4157091(15)  \\
0815 S1 & EPIC-pn/FF thin   & 			8.391105(35)    & 8.391143(58)	      & 53~147.68119387(43) &   53~147.6812041(15)  \\ 
S2	& EPIC-MOS1/FF thin   & 			8.391108(68)    & 8.39111(15)	        & 53~147.6883801(11)  &   53~147.6883883(31)  \\
S3	& EPIC-MOS2/FF thin   & 			8.391150(60)    & 8.39120(13)	        & 53~147.68838022(93) &   53~147.6883911(21)  \\
4670$^{5}$      & ACIS-CC          	 & 			8.3911146(15)	& 8.3911165(16)  	& 53,230.5756209(11)  &   53~230.5756243(19)  \\
4671$^{5}$      & ACIS-CC               &&&  &    \\
4672$^{5}$      & ACIS-CC               &					&			&  &    \\
4673$^{5}$      & ACIS-CC               &					&			&  &    \\
5581$^{6}$    	& HRC-S/LETG            & \multicolumn{2}{c}{8.391010(95)}				& 53,393.6674769(19)  &   53~393.6674775(23)  \\
0986 S3	& EPIC-pn/FF thin	 &			8.391138(23)	& 8.391140(30)  	& 53~488.67561302(44) &   53~488.67561797(84) \\
S1	& EPIC-MOS1/SW thin 	 &			8.391095(45)	& 8.391008(48)  	& 53~488.6695937(14)  &   53~488.6695969(13)  \\
S2	& EPIC-MOS2/SW thin 	 &			8.391183(38)	& 8.391018(53)  	& 53~488.6696892(13)  &   53~488.6696931(14)  \\
5582$^{7}$  	& HRC-S/LETG    	 & \multicolumn{2}{c}{8.391138(63)}				& 53~522.9398395(35)  &   53~522.9398385(29)  \\
6364$^{8}$	  & HRC-S/LETG      & \multicolumn{2}{c}{8.39129(25)}				&  53~610.0881154(30)  &   53~610.0881131(20)  \\
1060 S3	& EPIC-pn/FF thin	 &			8.391120(20)	& 8.391082(33) 	 	& 53~636.30015746(23) &   53~636.3001616(10)  \\
S1	& EPIC-MOS1/SW thin 	 &			8.391095(40)	& 8.391130(50) 	 	& 53~636.29413571(70) &   53~636.2941416(13)  \\
S2	& EPIC-MOS2/SW thin 	 &			8.391103(38)	& 8.391163(58) 	 	& 53~636.29413754(96) &   53~636.29413962(83) \\
6369$^{9}$    	& HRC-S/LETG            & \multicolumn{2}{c}{8.39110(11)}	       			&  53~652.2601916(17)  &   53~652.2601885(15)  \\ 
7177$^{9}$    	& HRC-S/LETG            &					&			&  &    \\
1086 S3	& EPIC-pn/FF thin	 &			8.391125(25)	& 8.391072(38)	   	& 53~687.17180535(53) &   53~687.17180817(92) \\
S1	& EPIC-MOS1/SW thin 	 &			8.391003(63)	& 8.391085(80)	   	& 53~687.1657835(12)  &   53~687.16588680(52) \\ 
S2	& EPIC-MOS2/SW thin 	 &			8.391200(55)	& 8.390998(78)	   	& 53~687.1658825(10)  &   53~687.1658857(12)  \\
7243$^{10}$   	& HRC-S/LETG            & \multicolumn{2}{c}{8.391115(10)}   	& 53~720.0243035(13)  &   53~720.0243020(12)  \\  
7244$^{10}$   	& HRC-S/LETG            &					&			&  &    \\
7245$^{10}$   	& HRC-S/LETG            &					&			&  &    \\
5584$^{10}$   	& HRC-S/LETG            &					&			&  &    \\
{\it 7251}	& {\it HRC-S/LETG}  & \multicolumn{2}{c}{{\it 8.39212(88)}} & {\it 53~775.3509131(17)}& {\it 53~775.35091144(12) }\\  
1181 S1	& EPIC-pn/FF thin	 &			8.391090(70)	& 8.39120(11) 	  & 53~877.32857154(71) &   53~877.3285752(11)  \\
S2	& EPIC-MOS1/SW thin 	 &			8.39137(17) 	& 8.39101(20) 	  & 53~877.3225489(15)  &   53~877.32255272(65) \\
S3	& EPIC-MOS2/SW thin 	 &			8.39131(13)   & 8.39116(18) 	  & 53~877.3225491(11)  &   53~877.3225524(16)  \\
1265 S1	& EPIC-pn/FF thin	 &			8.391075(65)	& 8.39104(11)  	 	& 54~044.60537610(44) &   54~044.6053791(11)  \\
S2	& EPIC-MOS1/FF thin	 &			8.39117(16) 	& 8.39074(17)  	 	& 54~044.5990605(12)  &   54~044.5990664(13)  \\
S3	& EPIC-MOS2/FF thin	 &			8.39099(13) 	& 8.39096(19)  	 	& 54~044.59906220(62) &   54~044.5990665(18)  \\
1356 S1	& EPIC-pn/FF thin	 &			8.391150(65)	& 8.391113(98) 	 	& 54~225.84098865(82) &   54~225.84099190(98) \\
S2	& EPIC-MOS1/FF thin	 &			8.39107(21) 	& 8.39066(27)  	 	& 54~225.8345794(18)  &   54~225.83457862(99) \\
S3	& EPIC-MOS2/FF thin	 &			8.39103(23) 	& 8.39096(22)  	 	& 54~225.8346806(13)  &   54~225.8346782(22)  \\
1454 S1	& EPIC-pn/FF thin	 &			8.391130(50)	& 8.391085(85) 	 	& 54~421.36989356(53) &   54~421.36989479(60) \\
S2	& EPIC-MOS1/FF thin	 &			8.39090(16) 	& 8.39109(17)  	 	& 54~421.3635797(17)  &   54~421.3635840(15)  \\
S3 & EPIC-MOS2/FF thin	 &			8.39131(22) 	& 8.39127(22)  	 	& 54~421.3635875(20)  &   54~421.3635849(18)  \\
10861$^{11}$	       & HRC-S/LETG            & \multicolumn{2}{c}{8.39129(20)}				& 54~863.7916775(17)  &   54~863.7916751(12)  \\ 
10700$^{11}$   	     & HRC-S/LETG            &					&			&  &    \\
1700 S3	& EPIC-pn/FF thin	 &			8.39108(99)	& 8.3912(12)		& 54~911.7856154(16)  &   54~911.78046975(81) \\
     U2	& EPIC-MOS1/FF thin	 &			8.39097(26)	& 8.39136(29)		& 54~911.7440458(30)  &   54~911.7440479(17)  \\
     U2	& EPIC-MOS2/FF thin	 &			8.39103(25)	& 8.39118(35)		& 54~911.7440524(13)  &   54~911.7440483(15)  \\
10701$^{12}$   	    & HRC-S/LETG            &					& 8.39119(20)    	& 55~085.6684206(14)  &   55~085.6684187(15)  \\
1792 S3	& EPIC-pn/FF thin	 &			8.39102(12)	& 8.39101(15)		& 55~096.30446151(69) &   55~096.3044632(11)  \\
     S1	& EPIC-MOS1/SW thin 	 &			8.39097(20)	& 8.39120(20)		& 55~096.2966932(13)  &   55~096.2966943(13)  \\
     S2	& EPIC-MOS2/SW thin 	 &			8.39104(15)	& 8.39102(24)		& 55~096.2967896(14)  &   55~096.2967885(11)  \\
\hline					        			
\end{tabular}
\tablefoot{The individual periods for ROSAT and Chandra HRC were not divided into soft (120--400~eV) and hard (400--1000~eV) band (see Sect.~3), hence we list the individual periods derived from all counts. We list the TOAs (definition equal to that in KvK05 and vK07) of the soft band (for the ``all data'' solution of the soft band, see Table~\ref{zusammenfassung}) and of the hard band (for the ``all~data'' solution of the hard band, see Table~\ref{zusammenfassung}). The errors of the periods \citep{2002AJ....124.1788R} and the TOAs (derived from the fitted light curves, see text) are given in parenthesis and denote 1$\sigma$ confidence level.}
\end{table}