\begin{table}%t3
%\centering
\par
\caption{\label{MIRphot}H$\alpha$ and {\em Spitzer} IRAC/MIPS photometry of the sample. Flux units are in erg~s$^{-1}$ cm$^{-2}$.}
\begin{tabular}{lrrrrrrr}
\hline \hline \noalign{\smallskip}
ID & $F^0_{{\rm H}\alpha} \: \: \: \:$ & $\lambda F_{\lambda}^{3.6}\:\:\:$ &  $\lambda F_{\lambda}^{4.5}\:\:\:$ &
$\lambda F_{\lambda}^{5.8}\:\:\:$ &  $\lambda F_{\lambda}^{8.0}\:\:\:$ & $\lambda F_{\lambda}^{24}\:\:\:$ \\
& $10^{-13}$~cgs$\:$ & $10^{-12}$~cgs$\:$ & $10^{-12}$ cgs$\:$ & $10^{-12}$ cgs$\:$ & $10^{-12}$ cgs$\:$
& $10^{-12}$ cgs$\:$ \\
\hline  
1 & 25.29~$\pm$~0.13 &  6.10~$\pm$~0.74 &  4.23~$\pm$~0.53 &  9.73~$\pm$~1.06 & 24.18~$\pm$~2.51 & 23.78~$\pm$~2.40 \\
2 &  4.82~$\pm$~0.15 &  0.22~$\pm$~0.10 &  0.17~$\pm$~0.07 &  0.50~$\pm$~0.11 &  1.65~$\pm$~0.23 &  0.75~$\pm$~0.09 \\
3 & 52.85~$\pm$~1.62 &  1.20~$\pm$~0.68 &  1.00~$\pm$~0.37 &  1.54~$\pm$~0.27 &  7.76~$\pm$~0.88 &  6.71~$\pm$~0.69 \\
4 & 26.33~$\pm$~0.56 &  2.65~$\pm$~0.38 &  2.16~$\pm$~0.31 &  6.43~$\pm$~0.73 & 16.40~$\pm$~1.71 & 15.77~$\pm$~1.60 \\
5 & 61.11~$\pm$~0.36 &  1.57~$\pm$~0.26 &  1.37~$\pm$~0.22 &  2.31~$\pm$~0.31 &  9.63~$\pm$~1.03 &  9.85~$\pm$~1.01 \\
6 &  4.80~$\pm$~0.24 &  1.92~$\pm$~0.32 &  1.06~$\pm$~0.20 &  3.07~$\pm$~0.39 &  7.04~$\pm$~0.77 &  3.14~$\pm$~0.33 \\
7 & 32.64~$\pm$~0.38 &  1.92~$\pm$~0.31 &  1.42~$\pm$~0.23 &  3.90~$\pm$~0.47 & 26.65~$\pm$~2.75 & 18.56~$\pm$~1.88 \\
8 & 11.48~$\pm$~0.34 &  4.08~$\pm$~0.55 &  2.51~$\pm$~0.35 & 10.67~$\pm$~1.16 & 26.15~$\pm$~2.69 & 16.17~$\pm$~1.64 \\
9 &  4.18~$\pm$~0.09 &  0.42~$\pm$~0.12 &  0.30~$\pm$~0.09 &  1.26~$\pm$~0.20 &  5.10~$\pm$~0.64 &  2.20~$\pm$~0.24 \\
10 &  2.51~$\pm$~0.07 &  0.28~$\pm$~0.09 &  0.20~$\pm$~0.07 &  0.76~$\pm$~0.14 &  3.31~$\pm$~0.40 &  2.39~$\pm$~0.26 \\
11 &  2.58~$\pm$~0.06 &  0.32~$\pm$~0.10 &  0.22~$\pm$~0.07 &  0.93~$\pm$~0.16 &  2.76~$\pm$~0.35 &  0.75~$\pm$~0.10 \\
12 & 19.92~$\pm$~0.13 & 11.96~$\pm$~1.35 &  7.63~$\pm$~0.88 & 18.95~$\pm$~1.98 & 35.46~$\pm$~3.61 & 24.89~$\pm$~2.51 \\
13 &  7.29~$\pm$~0.05 &  1.62~$\pm$~0.28 &  1.20~$\pm$~0.21 &  3.12~$\pm$~0.39 &  7.98~$\pm$~0.87 &  4.32~$\pm$~0.45 \\
14 &  3.15~$\pm$~0.08 &  0.54~$\pm$~0.14 &  0.37~$\pm$~0.10 &  1.42~$\pm$~0.21 &  3.81~$\pm$~0.44 &  1.89~$\pm$~0.21 \\
15 &  3.66~$\pm$~0.07 &  0.42~$\pm$~0.12 &  0.37~$\pm$~0.10 &  1.18~$\pm$~0.19 &  3.29~$\pm$~0.39 &  5.69~$\pm$~0.59 \\
16 &  0.72~$\pm$~0.02 &  0.08~$\pm$~0.05 &  0.05~$\pm$~0.04 &  0.21~$\pm$~0.06 &  1.21~$\pm$~0.17 &  0.38~$\pm$~0.06 \\
17 &  5.94~$\pm$~0.09 &  0.12~$\pm$~0.06 &  0.10~$\pm$~0.05 &  0.16~$\pm$~0.06 &  2.11~$\pm$~0.28 &  0.58~$\pm$~0.08 \\
18 &  0.72~$\pm$~0.02 &  0.10~$\pm$~0.05 &  0.06~$\pm$~0.04 &  0.15~$\pm$~0.05 &  0.46~$\pm$~0.09 &  0.19~$\pm$~0.03 \\
19 &  4.13~$\pm$~0.08 &  0.16~$\pm$~0.07 &  0.12~$\pm$~0.05 &  0.29~$\pm$~0.08 &  2.14~$\pm$~0.27 &  0.46~$\pm$~0.06 \\
20 &  0.30~$\pm$~0.01 &  0.03~$\pm$~0.03 &  0.02~$\pm$~0.02 &  0.07~$\pm$~0.04 &  0.23~$\pm$~0.06 &  0.09~$\pm$~0.02 \\
21 &  4.88~$\pm$~0.15 &  0.17~$\pm$~0.08 &  0.12~$\pm$~0.06 &  0.18~$\pm$~0.06 &  1.30~$\pm$~0.21 &  0.51~$\pm$~0.08 \\
22 &  0.68~$\pm$~0.01 &  0.10~$\pm$~0.05 &  0.06~$\pm$~0.04 &  0.15~$\pm$~0.05 &  0.40~$\pm$~0.08 &  0.15~$\pm$~0.03 \\
23 &  1.78~$\pm$~0.04 &  0.09~$\pm$~0.05 &  0.07~$\pm$~0.04 &  0.08~$\pm$~0.04 &  0.48~$\pm$~0.10 &  0.13~$\pm$~0.03 \\
24 &  0.43~$\pm$~0.01 &  0.08~$\pm$~0.07 &  0.05~$\pm$~0.04 &  0.10~$\pm$~0.04 &  0.23~$\pm$~0.06 &  0.07~$\pm$~0.02 \\
25 & 25.56~$\pm$~0.87 &  4.76~$\pm$~0.60 &  3.96~$\pm$~0.50 & 14.34~$\pm$~1.52 & 39.06~$\pm$~3.99 & 72.34~$\pm$~7.26 \\
26 & 15.36~$\pm$~0.34 &  1.34~$\pm$~0.26 &  0.92~$\pm$~0.19 &  5.04~$\pm$~0.60 & 34.17~$\pm$~3.60 &  8.75~$\pm$~0.91 \\
27 &  4.14~$\pm$~0.14 &  1.54~$\pm$~0.26 &  1.09~$\pm$~0.19 &  5.15~$\pm$~0.60 & 16.57~$\pm$~1.73 &  8.75~$\pm$~0.90 \\
28 & 12.52~$\pm$~0.25 &  1.93~$\pm$~0.31 &  1.55~$\pm$~0.25 &  4.39~$\pm$~0.52 & 12.29~$\pm$~1.33 & 12.10~$\pm$~1.23 \\
29 &  6.74~$\pm$~0.23 &  0.91~$\pm$~0.21 &  0.63~$\pm$~0.15 &  3.11~$\pm$~0.40 &  4.64~$\pm$~0.66 &  2.70~$\pm$~0.30 \\
30 & 16.18~$\pm$~0.53 &  3.32~$\pm$~0.46 &  2.09~$\pm$~0.31 &  9.32~$\pm$~1.03 & 28.48~$\pm$~2.96 & 11.66~$\pm$~1.19 \\
31 & 18.67~$\pm$~0.47 &  1.78~$\pm$~0.29 &  1.11~$\pm$~0.20 &  6.18~$\pm$~0.70 & 45.39~$\pm$~4.63 & 12.18~$\pm$~1.24 \\
32 &  1.53~$\pm$~0.06 &  0.44~$\pm$~0.12 &  0.28~$\pm$~0.09 &  1.42~$\pm$~0.21 &  3.29~$\pm$~0.39 &  2.20~$\pm$~0.24 \\
\hline  
\end{tabular} 
\vspace*{-3mm}
\end{table}