\begin{table}%t3
%\centering
\par
\caption{\label{tab:param}Parameters used to fit the data (see text for further details).}
\begin{tabular}{@{\extracolsep{\fill}} lcccccccccc}
\hline\hline\noalign{\smallskip}
	& $\delta$ & $R$ & $B$ & $K$ & $u_{e}/u_{B}$ & $\gamma_{\rm{min}}$ & $\gamma_{\rm{break}}$ & $\gamma_{\rm{max}}$ & $n_{1}$ & $n_{2}$ \\
	&  &  $[10^{16}~\rm{cm}]$ & [G] & $[\rm{cm}^3]$ & & & &  & &\\
	\hline
 & $10$ & $1.9$ & $0.1$ & $2.6\times10^3$ & $30$ & $1$ & $2.7\times10^5$ & $5\times10^6$ & $2.2$ & $3.0$  \\ 
\hline
\end{tabular}
\end{table}