\begin{table}%t1
%\centering
\par
\caption{\label{cuttable}Summary of applied cuts.}
\begin{tabular}{ll}
\hline\hline\noalign{\smallskip}
 Cut &	Value	\\
\hline
 image centroid distance		&	2.5~deg		\\
 image amplitude	&	$>$60~photoelectrons	\\
 \# of telescopes	&	$\ge$3	\\	
 core impact position	&	$\le$500~m	\\
 reduced 3D width $\omega$&	$<$0.002	\\
 $\theta^2$		&	$<$0.01~deg$^2$\\
\hline
\end{tabular}
\end{table}