\begin{table}%t1
%\centering
\par
\caption{\label{summary}Summary of the data.}
\begin{tabular}{lr}
\hline \hline\noalign{\smallskip}
Number of unique objects                      & 17~970~937\\
Number of raw science images                  &  3~631~972\\
Number of flat field frames                   & 257~267\\
Number of bias frames                         & 119~175\\
Number of thermal frames                      & 71~302\\
Number of data points                         & 119~930~299~362\\
Average number of data points per light curve & 6674\\
Maximum number of data points                 & 74~013\\
Light curve disk space                        & 5.0 TB\\
Raw science image disk space                  & 14.5 TB\\
Raw calibration image disk space              & 1.6 TB\\
\hline
Start date (North)                            & 2/5/2004\\
End date (North)                              & 9/8/2008\\
Longitude (North)                             & $-$17:52:45\\
Latitude (North)                              & 28:45:37\\
Minimum declination (North)                   & +20\\
Maximum declination (North)                   & +65.86\\
\hline
Start date (South)                            & 13/2/2006\\
End date (South)                              & 27/5/2008\\
Longitude (South)                             & 20:48:38\\
Latitude (South)                              & $-$32:22:51\\
Minimum declination (South)                   & $-$20\\
Maximum declination (South)                   & $-$89.07\\
\hline
\end{tabular}
\end{table}