\begin{table}%[t]%t1
%\centering
\par
  \caption {\label{T-emlines}Emission line identification and fluxes, relative
    to $F_{\rm H\beta}=100$.} %\vspace*{-2mm}
\begin{tabular}{llr}
\hline\hline
\noalign{\smallskip}
  Identification & $\lambda [\AA]$       & $F_{\rm obs}$ \\
\hline\\[-4pt]
\hi\         & 4340.5 &    18 \\ 
\oiii\       & 4363.2 & $^\star$ \\ 
\heii\       & 4685.7 &    26 \\ 
\hi\         & 4861.4 &   100 \\ 
\oiii\       & 4958.9 &    24 \\ 
\oiii\       & 5006.8 &    81 \\ 
\heii\       & 5411.5 &     5 \\ 
\fevii\      & 5720.9 &    11 \\ 
\hei\        & 5875.6 &    80 \\ 
\cav/\fevii\ & 6086   &    26 \\ 
\par
\oi\         & 6300.3 &    11 \\ 
\par
\siii\       & 6312.1 &     4  \\ 
\par
\hi\         & 6562.8 &  5500$:$ \\ 
\par
\nii         & 6583.4 &   60$:$ \\ 
\par
\hei\        & 6678.2 &    55 \\ 
\par
\sii\        & 6716.4 &     5 \\ 
\par
\sii\        & 6730.8 &     4 \\ 
\par
Raman        & 6825   &    19 \\ 
\par
\hei\        & 7065   &   218 \\ 
\par
Raman        & 7082   &     6 \\ 
\par
\ariii\      & 7135.8 &    20 \\ 
\par
\feii\       & 7155.1 &    11 \\ 
\par
\feii\       & 7172.0 &     9 \\ 
\par
\ariv\       & 7236.0 &     4 \\ 
\par
\hei\        & 7281.4 &    21 \\ 
\par
\oii\        & 7319   &    16 \\ 
\par
\oii\        & 7330   &    13 \\[2pt]
\par
\hline\\[-4pt]                             
\par
\end{tabular}
\vspace*{-2mm}
\tablefoot{
  \tablefoottext{\star}{Marginal detection;}
  \tablefoottext{:}{uncertain flux because of blending.}}
\vspace*{12cm}
\end{table}