\begin{table}%t1
%\centering
\par
\caption{\label{Resum}Comparison of APLC performances when designed for the VLT pupil (Proto 1) or the E-ELT pupil (Proto~2), with contrasts evaluated on azimuthally averaged profiles.}
\begin{tabular}{llll}
\hline \hline\noalign{\smallskip}
Telescope aperture  & $\mathscr{C}_{3\lambda/D}$ & $\mathscr{C}_{12\lambda/D}$ & $\mathscr{C}_{20\lambda/D}$   \\
\hline\noalign{\smallskip}
VLT (Proto~1) & $5.0 \times 10^{-5}$ & $2.3 \times 10^{-6}$ & $1.2\times10^{-6}$ \\
E-ELT (Proto~2) & $5.1 \times 10^{-4}$ & $2.6 \times 10^{-6}$ & $1.4 \times 10^{-6}$ \\
\hline
\end{tabular}
\end{table}