\begin{table} 
\caption{\label{tab8}\ion{Fe}{ii} lines in the 3800$-$8000~\AA\ region with $\log~gf \ge -$1.5 and 3d$^{6}$($^{3}$F)4f energy levels as upper levels.} 
\small%\centering
\par
\begin{tabular}{llllllllllll}
\hline\hline\noalign{\smallskip}
\multicolumn{4}{c}{Upper level}&
\multicolumn{2}{c}{Lower level}&
\multicolumn{1}{c}{$\lambda$(calc)}&
\multicolumn{1}{c}{$\log~gf$}&
\multicolumn{1}{c}{$\lambda$(obs)}&
\multicolumn{1}{c}{Notes}
\\
\noalign{\smallskip} 
\multicolumn{1}{c}{cm$^{-1}$}&
\multicolumn{1}{c}{} &
\multicolumn{1}{c}{} &
\multicolumn{1}{c}{$J$} &
\multicolumn{1}{c}{cm$^{-1}$}&
\multicolumn{1}{c}{} &
\multicolumn{1}{c}{\AA} &
\multicolumn{1}{c}{KUR} &
\multicolumn{1}{c}{\AA} 
\\
\hline\noalign{\smallskip}
124~421.468 & ($^{3}$F)4f & 4[7] & 15/2 & 103~617.580 & ($^{3}$H)4d $^{4}$H$_{13/2}$ & 4805.451 & $-$0.972&  4805.42&\\  
           &             &      &      & 104~064.670 & ($^{3}$H)4d $^{4}$I$_{13/2}$ & 4910.993 & $-$1.090&        & at the continuum level\\  
           &             &      &      & 104~119.710 & ($^{3}$H)4d $^{2}$K$_{15/2}$ & 4924.307 & $-$1.174&        & not obs\\  
           &             &      &      & 104~622.300 & ($^{3}$H)4d $^{2}$I$_{13/2}$ & 5049.309 & $-$1.258&  5049.3 & very weak\\  
           &             &      &      & 105~288.847 & ($^{3}$F)4d $^{4}$H$_{13/2}$ & 5225.221 & $+$0.974&  5225.229 & lab, J78\\ 
\\
124~436.436 & ($^{3}$F)4f & 4[7] & 13/2 & 103~600.430 & ($^{3}$H)4d $^{4}$G$_{11/2}$ & 4798.043 & $-$1.190&          &at the continuum level\\
           &             &      &      & 103~751.660 & ($^{3}$H)4d $^{4}$H$_{11/2}$ & 4833.123 & $-$1.441&          & \\
           &             &      &      & 104~315.370 & ($^{3}$H)4d $^{2}$K$_{13/2}$ & 4968.529 & $-$1.078&   4968.53 & very weak\\
           &             &      &      & 104~765.450 & ($^{3}$H)4d $^{2}$I$_{11/2}$ & 5082.213 & $-$1.265&          &blend\\
           &             &      &      & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$ & 5160.416 & $-$0.003&   5160.4 & lab\\
           &             &      &      & 105~288.847 & ($^{3}$F)4d $^{4}$H$_{13/2}$ & 5221.136 & $-$0.831&          & blend,weak component \\
           &             &      &      & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$ & 5251.306 & $+$0.664&  5251.321 & blend\\
           &             &      &      & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5353.789 & $+$0.076&  5353.80 &\\
           &             &      &      & 106~045.690 & ($^{3}$H)4d $^{2}$H$_{11/2}$ & 5436.006 & $-$0.154&  5436.12 &\\
           &             &      &      & 108~630.429 & ($^{1}$I)5s e$^{2}$I$_{11/2}$ & 6324.960 & $-$1.433&          &at the continuum level\\
\\
124~400.107 & ($^{3}$F)4f & 4[6] & 13/2 & 103~600.430 & ($^{3}$H)4d $^{4}$G$_{11/2}$  & 4806.424 & $-$0.542&  4806.4&\\
           &             &      &      & 104~174.270 & ($^{3}$H)4d $^{4}$I$_{11/2}$  & 4942.792 & $-$1.458&        &very weak\\
           &             &      &      & 104~765.450 & ($^{3}$H)4d $^{2}$I$_{11/2}$  & 5091.616 & $-$0.517&  5091.6&\\
           &             &      &      & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$  & 5170.111 & $+$0.742&  5170.10& J78,lab, blended\\
           &             &      &      & 105~288.850 & ($^{3}$F)4d $^{4}$H$_{13/2}$  & 5231.062 & $+$0.278&  5231.067& lab\\
           &             &      &      & 105~398.850 & ($^{3}$F)4d $^{4}$H$_{11/2}$  & 5261.345 & $+$0.080&  5261.339& shifted?\\
           &             &      &      & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$  & 5364.226 & $-$0.538&  5364.22&\\
           &             &      &      & 106~045.690 & ($^{3}$H)4d $^{2}$H$_{11/2}$  & 5446.766 & $-$0.314&  5446.75&blend\\
\par
\\
124~402.557 & ($^{3}$F)4f & 4[6] & 11/2 & 103~683.070 & ($^{5}$D)5d $^{4}$F$_{9/2}$  & 4825.028 & $-$1.407&        \\
           &             &      &      & 104~765.450 & ($^{3}$H)4d $^{2}$I$_{11/2}$  & 5090.983 & $-$1.256&         &blend\\
           &             &      &      & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$    & 5101.830 & $-$1.382 & 5101.82&  \\
           &             &      &      & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$    & 5130.460 & $+$0.158 &  \\
           &             &      &      & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$  & 5169.456 & $-$0.871&        &computed too strong \\
           &             &      &      & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$  & 5194.042 & $-$0.084 &  5194.047  \\
           &             &      &      & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$  & 5209.193 & $-$0.494 &  5209.199  \\
           &             &      &      & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$ & 5260.668 & $-$0.049 &  5260.682&  \\
           &             &      &      & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$  & 5295.671 & $-$1.274 &  5295.662& computed too weak \\
           &             &      &      & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5363.520 & $-$0.269 &  5363.51 &  \\
           &             &      &      & 106~018.643 & ($^{3}$F)4d $^{2}$H$_{9/2}$  & 5438.027 & $-$0.914 &         &blend  \\
           &             &      &      & 106~045.690 & ($^{3}$H)4d $^{2}$H$_{11/2}$ & 5446.039 & $-$0.626 &  5446.05 &   \\
           &             &      &      & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$  & 5461.459 & $+$0.179 &  5461.48 &  \\
           &             &      &      & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$  & 5654.418 & $-$0.044 &          & computed too strong  \\
           &             &      &      & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$  & 5719.850 & $+$0.097 &  5719.85 & lab,J78 \\
           &             &      &      & 109~925.200 & ($^{3}$G)4d $^{2}$G$_{9/2}$  & 6765.246 & $-$1.049 &            &  \\
           &             &      &      & 110~008.300 & ($^{3}$G)4d $^{2}$H$_{9/2}$  & 6945.303 & $-$1.190 &            &  \\
\par
\\
124~388.840 & ($^{3}$F)4f & 4[5] & 11/2 & 103~600.430 & ($^{3}$H)4d $^{4}$G$_{11/2}$  & 4809.029 & $-$0.852&  4809.02&\\
           &             &      &      & 103~683.070 & ($^{5}$D)5d $^{4}$F$_{9/2}$   & 4828.222 & $-$0.829&        & \\
           &             &      &      & 103~771.320 & ($^{3}$H)4d $^{4}$G$_{9/2}$   & 4848.889 & $-$0.699&        & weak, on the H$_{\beta}$ wing\\
           &             &      &      & 104~765.450 & ($^{3}$H)4d $^{2}$I$_{11/2}$  & 5094.540 & $-$0.517&  5094.55 & lab\\
           &             &      &      & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$   & 5105.404 & $+$0.158& 5105.4 & \\
           &             &      &      & 104~868.500 & ($^{5}$D)5d $^{6}$G$_{9/2}$   & 5121.435 & $-$0.968&  5121.45 & weak\\
           &             &      &      & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$   & 5134.072 & $-$0.161&  & blend\\
           &             &      &      & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$  & 5173.126 & $+$0.425& 5173.12 & lab\\
           &             &      &      & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$   & 5197.747 & $-$0.166& 5197.756 & \\
           &             &      &      & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$   & 5212.916 & $-$0.199&       &blend \\
           &             &      &      & 105~288.847 & ($^{3}$F)4d $^{4}$H$_{13/2}$  & 5234.147 & $-$0.630&    &blend \\
           &             &      &      & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$  & 5264.468 & $-$0.717& 5264.45  & \\
           &             &      &      & 106~045.690 & ($^{3}$H)4d $^{2}$H$_{11/2}$  & 5450.112 & $-$1.282&    & blend\\
           &             &      &      & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$   & 5658.806 & $-$0.643&    & blend \\
           &             &      &      & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$   & 5724.343 & $-$0.429&   &blend, computed too strong\\
           &             &      &      & 109~811.920 & ($^{3}$G)4d $^{4}$F$_{9/2}$   & 6858.267.& $-$0.903&    &at the continuum level \\
\hline 
124~385.706 & ($^{3}$F)4f & 4[5] & 9/2 & 103~771.320 & ($^{3}$H)4d $^{4}$G$_{9/2}$    & 4849.626 & $-$1.159 &   &H$_{\beta}$ wing, not obs.  \\
           &             &      &     & 103~986.330 & ($^{3}$H)4d $^{4}$H$_{7/2}$    & 4900.742 & $-$1.404&  & at the continuum level  \\
           &             &      &     & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$    & 5106.222 & $-$0.305&   &   \\
           &             &      &     & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$    & 5155.371 & $-$0.195&  5155.37 &computed too strong   \\
           &             &      &     & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$   & 5173.965 & $-$0.955&  5173.98 &computed too weak\\
           &             &      &     & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$    & 5189.933 & $-$0.112&         &blend\\
           &             &      &     & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$    & 5198.594 & $-$0.154&  5198.596 &\\
           &             &      &     & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$    & 5213.769 & $-$0.389&  5213.78 &\\
           &             &      &     & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$    & 5216.634 & $-$1.420&  &\\
           &             &      &     & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$    & 5235.599 & $-$0.769&           & blend   \\
           &             &      &     & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$   & 5265.337 & $-$0.986&  5265.323 &    \\
           &             &      &     & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$    & 5371.899 & $+$0.199&  5371.90 &    \\
           &             &      &     & 106~018.640 & ($^{3}$F)4d $^{2}$H$_{9/2}$    & 5443.015 & $-$1.240&   &  \\
           &             &      &     & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$    & 5466.492 & $-$0.492&  5466.49 &blend    \\
           &             &      &     & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$    & 5659.810 & $-$1.436&     &blend  \\
           &             &      &     & 106~767.210 & ($^{3}$F)4d $^{4}$F$_{7/2}$    & 5674.279 & $-$1.037& 5674.30 &    \\
           &             &      &     & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$    & 5717.492 & $-$1.080&         &blend    \\
           &             &      &     & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$    & 5725.370 & $-$0.147& 5725.35 &    \\
           &             &      &     & 110~167.280 & ($^{3}$G)4d $^{4}$F$_{7/2}$    & 7031.188 & $-$1.480&         &not observed    \\
           &             &      &     & 110~570.300 & ($^{3}$G)4d $^{2}$F$_{7/2}$    & 7236.302 & $-$1.125&         &not observed    \\
\\
124~401.939 & ($^{3}$F)4f & 4[4] & 9/2 & 103~683.070 & ($^{5}$D)5d $^{4}$F$_{9/2}$    & 4825.170 & $-$0.851&    & \\
           &             &      &     & 103~771.320 & ($^{3}$H)4d $^{4}$G$_{9/2}$    & 4845.810 & $-$1.216&    & on the H$_{\beta}$ wing \\
           &             &      &     & 104~481.590 & ($^{3}$H)4d $^{2}$F$_{7/2}$    & 5018.593 & $-$0.782&    & blend Fe~II 5018.440 \\
           &             &      &     & 104~765.450 & ($^{3}$H)4d $^{2}$I$_{11/2}$   & 5091.141 & $-$1.199&  5091.15 & \\
           &             &      &     & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$    & 5101.991 & $-$0.285   &       & wrong,not observed \\
           &             &      &     & 104~868.500 & ($^{5}$D)5d $^{6}$G$_{9/2}$    & 5118.000 & $-$0.871&  5117.98 & \\
           &             &      &     & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$    & 5130.621 & $+$0.114&  5130.60 &lab \\
           &             &      &     & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$    & 5151.058 & $-$0.280&  5151.07 &lab \\
           &             &      &     & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$   & 5169.622 & $-$0.361&  5169.6  & \\
           &             &      &     & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$    & 5194.209 & $-$1.245&         & blend Fe~III \\
           &             &      &     & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$    & 5209.359 & $-$1.260&         &  \\
           &             &      &     & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$    & 5211.949 & $+$0.055&  5211.953 & lab \\
           &             &      &     & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$    & 5231.152 & $-$0.836&         & blend \\
           &             &      &     & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$   & 5363.698 & $-$1.391&         & blend \\
           &             &      &     & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$    & 5367.218 & $-$0.182&  5367.22 &  \\
           &             &      &     & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$    & 5461.644 & $-$0.455&  5461.65&  \\
           &             &      &     & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$    & 5654.613 & $-$0.197&  5654.62&   \\
           &             &      &     & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$    & 5712.189 & $-$1.361&         &at the level of the noise  \\
           &             &      &     & 109~811.920 & ($^{3}$G)4d $^{4}$F$_{9/2}$    & 6852.110 & $-$0.955&         &at the level of the noise  \\
\\
124~385.010 & ($^{3}$F)4f & 4[4] & 7/2 & 103~191.917 & ($^{3}$P)4d $^{2}$F$_{7/2}$    & 4717.199 & $-$1.461&     &   \\
           &             &      &     & 103~597.402 & ($^{3}$P)4d $^{2}$D$_{5/2}$    & 4809.214 & $-$1.233&         &  \\
           &             &      &     & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$    & 5106.403 & $-$1.091&         &  \\
           &             &      &     & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$    & 5155.556 & $-$0.412&  5155.56 &  \\
           &             &      &     & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$    & 5190.121 & $-$0.246&  5190.123 &  \\
           &             &      &     & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$    & 5198.782 & $-$0.950&         &blend  \\
           &             &      &     & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$    & 5213.958 & $-$1.188&         &blend  \\
           &             &      &     & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$    & 5216.553 & $-$1.332&         &blend  \\
           &             &      &     & 105~234.237 & ($^{3}$H)4d $^{4}$F$_{5/2}$    & 5220.268 & $-$1.463&  & \\
           &             &      &     & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$    & 5235.790 & $-$0.829&         &blend\\
           &             &      &     & 105~775.836 & ($^{3}$F)4d $^{2}$F$_{7/2}$    & 5372.100 & $+$0.165&  5372.10 &lab\\
           &             &      &     & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$    & 5466.700 & $-$1.095&         &at the level of the noise\\
           &             &      &     & 106~208.560 & ($^{3}$F)4d $^{2}$F$_{5/2}$    & 5500.096 & $-$0.922&         &blend\\
           &             &      &     & 106~767.210 & ($^{3}$F)4d $^{4}$F$_{7/2}$    & 5674.503 & $-$1.298&  5674.50 &computed too weak\\
           &             &      &     & 106~796.660 & ($^{3}$F)4d $^{4}$P$_{5/2}$    & 5684.004 & $-$0.895&         &\\
           &             &      &     & 106~866.760 & ($^{3}$F)4d $^{4}$F$_{5/2}$    & 5706.743 & $-$0.920&         &\\
           &             &      &     & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$    & 5717.719 & $-$1.023&         &not observed\\
\hline 
124~385.010 & cont.       &      &     & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$    & 5725.598 & $-$0.824&  5725.60 &\\
           &             &      &     & 107~407.800 & ($^{3}$F)4d $^{2}$D$_{5/2}$    & 5888.617 & $-$0.044&  5888.61 &\\
           &             &      &     & 110~570.300 & ($^{3}$G)4d $^{2}$F$_{7/2}$    & 7236.667 & $-$1.221&         &at the level of the noise\\
\\
124~416.110 & ($^{3}$F)4f & 4[3] & 7/2 & 103~683.070 & ($^{5}$D)5d $^{4}$F$_{9/2}$    & 4821.172 & $-$1.273&  \\
           &             &      &     & 104~481.590 & ($^{3}$H)4d $^{2}$F$_{7/2}$    & 5015.025 & $-$0.607& 5015.02 &  \\
           &             &      &     & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$    & 5098.304 & $-$0.623&         &\\           
           &             &      &     & 104~868.500 & ($^{5}$D)5d $^{6}$G$_{9/2}$    & 5114.290 & $-$1.355&     &computed too strong\\      
           &             &      &     & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$    & 5126.892 & $-$0.477& 5126.84 & lab, blend  \\       
           &             &      &     & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$   &5147.300 & $+$0.051& 5147.25 & blend,lab  \\
           &             &      &     & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$   &5181.754 & $-$1.028& 5181.75 & computed too weak \\
           &             &      &     & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$   &5190.388 & $-$1.077&         & blend \\
           &             &      &     & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$   &5205.515 & $-$1.184&         & blend  \\
           &             &      &     & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$   &5208.101 & $+$0.031& 5208.99 &         \\
           &             &      &     & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$   &5227.276 & $-$1.201&         & blend  \\
           &             &      &     & 105~379.430 & ($^{3}$F)4d $^{4}$D$_{5/2}$   &5251.555 & $-$1.289&         &at the continuum level\\
           &             &      &     & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$   &5363.137 & $-$0.687& 5363.15 &       \\
           &             &      &     & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$   &5457.419 & $-$1.335&         & blend  \\
           &             &      &     & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$   &5650.084 & $-$0.819&         & blend  \\
           &             &      &     & 106~767.210 & ($^{3}$F)4d $^{4}$F$_{7/2}$   &5664.504 & $-$1.029&      & at the level of the noise\\
           &             &      &     & 106~796.660 & ($^{3}$F)4d $^{4}$P$_{5/2}$   &5673.972 & $-$0.486& 5673.93 &blend  \\
           &             &      &     & 107~407.800 & ($^{3}$F)4d $^{2}$D$_{5/2}$   &5877.850 & $-$1.281&     & at the level of the noise \\
           &             &      &     & 109~811.920 & ($^{3}$G)4d $^{4}$F$_{9/2}$   &6845.461 & $-$1.364&         & not observed  \\
\\
124~403.474 & ($^{3}$F)4f & 4[3] & 5/2 & 103~597.402 &  ($^{3}$P)4d $^{2}$D$_{5/2}$ & 4804.946 & $-$1.146& 4804.93 & computed too weak \\
           &             &      &     & 104~993.860 &  ($^{3}$F)4d $^{4}$D$_{7/2}$ & 5150.651 & $-$0.855&         & \\
           &             &      &     & 105~123.000 &  ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5185.150 & $-$0.746& 5185.141& lab,blend  \\
           &             &      &     & 105~234.237 &  ($^{3}$H)4d $^{4}$F$_{5/2}$ & 5215.240 & $-$1.455&          & blend  \\
           &             &      &     & 105~291.010 &  ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5230.732 & $-$1.416&          & blend  \\
           &             &      &     & 105~317.440 &  ($^{3}$P)4d $^{2}$P$_{3/2}$ & 5237.975 & $-$1.304&          & blend  \\
           &             &      &     & 105~460.230 &  ($^{3}$F)4d $^{4}$D$_{3/2}$ & 5277.458 & $-$0.778&          &wrong, not observed  \\
           &             &      &     & 105~518.140 &  ($^{3}$H)4d $^{4}$F$_{3/2}$ & 5293.641 & $-$1.294& 5293.627 & computed too low?  \\
           &             &      &     & 105~775.491 &  ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5366.775 & $-$0.450& 5366.78  &  \\
           &             &      &     & 106~208.560 &  ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5494.515 & $-$0.721& 5494.51  &   \\
           &             &      &     & 106~796.660 &  ($^{3}$F)4d $^{4}$P$_{5/2}$ & 5678.044 & $-$1.006&          &computed too strong   \\
           &             &      &     & 106~866.760 &  ($^{3}$F)4d $^{4}$F$_{5/2}$ & 5700.741 & $-$0.790& 5700.76  &   \\
           &             &      &     & 107~065.900 &  ($^{3}$F)4d $^{4}$P$_{3/2}$ & 5766.220 & $-$1.192&      &at the level of the noise\\
           &             &      &     & 107~407.800 &  ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5882.220 & $-$0.040& 5882.22  &   \\
           &             &      &     & 107~430.250 &  ($^{3}$F)4d $^{2}$D$_{3/2}$ & 5890.000 & $-$0.918&          & blend Na~I  \\
           &             &      &     & 108~105.900 &  ($^{3}$F)4d $^{2}$P$_{3/2}$ & 6134.185 & $-$0.702& 6134.2   & \\
           &             &      &     & 110~611.800 &  ($^{3}$G)4d $^{2}$F$_{5/2}$ & 7248.754 & $-$1.434&          & blend with telluric\\
\\
124~434.563 & ($^{3}$F)4f & 4[2] & 5/2 & 103~597.402 &  ($^{3}$P)4d $^{2}$D$_{5/2}$ & 4797.777 & $-$1.440&         &  \\
           &             &      &     & 104~120.270 &  ($^{5}$D)5d $^{6}$P$_{5/2}$ & 4921.269 & $-$0.982&         & blend \\
           &             &      &     & 104~209.610 &  ($^{3}$H)4d $^{2}$F$_{5/2}$ & 4943.008 & $-$1.371& 4943.0        &  \\
           &             &      &     & 104~481.590 &  ($^{3}$H)4d $^{2}$F$_{7/2}$ & 5010.387 & $-$0.817& 5010.4        &  \\
           &             &      &     & 104~993.860 &  ($^{3}$F)4d $^{4}$D$_{7/2}$ & 5142.414 & $-$0.113& 5142.42 & lab  \\
           &             &      &     & 105~213.000 &  ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5176.803 & $-$1.156&         & blend \\
           &             &      &     & 105~127.770 &  ($^{5}$D)5d $^{4}$D$_{5/2}$ & 5178.082 & $-$1.132& 5178.08 & computed too weak  \\
           &             &      &     & 105~220.600 &  ($^{3}$H)4d $^{4}$F$_{7/2}$ & 5203.100 & $-$0.191& 5203.10 &  \\
           &             &      &     & 105~379.430 &  ($^{3}$F)4d $^{4}$D$_{5/2}$ & 5246.469 & $-$0.830&         & at the noise level, computed too strong \\
           &             &      &     & 105~775.491 &  ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5357.833 & $-$1.105&         &  \\
           &             &      &     & 106~208.560 &  ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5485.142 & $-$1.413&         &  \\
           &             &      &     & 106~767.210 &  ($^{3}$F)4d $^{4}$F$_{7/2}$ & 5658.587 & $-$1.147&         & blend \\
           &             &      &     & 106~796.660 &  ($^{3}$F)4d $^{4}$P$_{5/2}$ & 5668.035 & $-$0.132& 5668.05 & computed too strong  \\
           &             &      &     & 106~866.760 &  ($^{3}$F)4d $^{4}$F$_{5/2}$ & 5690.652 & $-$1.300& 5690.68 & computed too weak \\
           &             &      &     & 107~407.800 &  ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5871.480 & $-$1.133&         &  \\
\\
\hline 
124~460.410& ($^{3}$F)4f & 4[2] & 3/2 & 104~120.270 &  ($^{5}$D)5d $^{6}$P$_{5/2}$ & 4915.015 & $-$1.449&      & \\
           &             &      &     & 104~189.380 &  ($^{5}$D)5d $^{4}$P$_{3/2}$ & 4931.772 & $-$1.122&      & wrong,not observed\\
           &             &      &     & 105~234.060 &  ($^{3}$H)4d $^{4}$F$_{5/2}$ & 5199.747 & $-$1.496&     & \\
           &             &      &     & 105~317.440 &  ($^{3}$P)4d $^{2}$P$_{3/2}$ & 5222.396 & $-$0.923&          & blend  \\
           &             &      &     & 105~379.430 &  ($^{3}$F)4d $^{4}$D$_{5/2}$ & 5239.362 & $-$1.350&          & blend  \\
           &             &      &     & 105~460.230 &  ($^{3}$F)4d $^{4}$D$_{3/2}$ & 5261.644 & $-$0.436&          &wrong, not observed  \\
           &             &      &     & 105~518.140 &  ($^{3}$H)4d $^{4}$F$_{3/2}$ & 5277.730 & $-$1.098&          & blend  \\
           &             &      &     & 106~208.560 &  ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5477.375 & $-$1.153&          & at the level of the noise  \\
           &             &      &     & 106~846.650 &  ($^{3}$F)4d $^{4}$F$_{3/2}$ & 5675.805 & $-$1.332&          & at the level of the noise  \\
           &             &      &     & 106~866.760 &  ($^{3}$F)4d $^{4}$F$_{5/2}$ & 5682.292 & $-$0.926&          & at the level of the noise  \\
           &             &      &     & 107~065.930 &  ($^{3}$F)4d $^{4}$P$_{3/2}$ & 5747.356 & $-$0.824&          & at the level of the noise  \\
           &             &      &     & 107~407.800 &  ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5862.580 & $-$0.452& 5862.58  & at the level of thec noise \\
           &             &      &     & 107~430.250 &  ($^{3}$F)4d $^{2}$D$_{3/2}$ & 5870.308 & $-$0.663& 5870.30  & computed too weak \\
           &             &      &     & 108~105.900 &  ($^{3}$F)4d $^{2}$P$_{3/2}$ & 6112.829 & $-$0.452&   & EMISSION? \\
\\
124~661.274 & ($^{3}$F)4f& 3[6]  &13/2 & 103~751.660 & ($^{3}$H)4d $^{4}$H$_{11/2}$ & 4781.152 &$-$1.241 & 4781.15 & computed too weak \\
           &            &       &     & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$ & 5101.212 &$-$1.511 & 5101.2 & computed too weak \\
           &            &        &       & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$ & 5190.010 &$+$0.482 & 5190.012&\\
           &            &        &       & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5290.092 &$+$0.589 & 5290.094&\\  
           &            &        &       & 106~045.690 & ($^{3}$H)4d $^{2}$H$_{11/2}$ & 5370.350 &$+$0.111 & 5370.3  & Fe~II,5270.284 main comp. \\
\\
124~656.535 & ($^{3}$F)4f& 3[6]  &11/2    & 103~874.260 & ($^{3}$H)4d $^{4}$H$_{9/2}$ & 4810.449 &$-$1.268 & 4810.45 & weak \\
           &            &        &       & 104~192.480 & ($^{3}$H)4d $^{4}$I$_{9/2}$ & 4885.254 &$-$1.238 &         & blend\\
           &            &        &       & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$ & 5126.398 &$-$0.847 &         & very weak\\
           &            &        &       & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$& 5191.288 &$-$1.025 &         & blend\\
           &            &        &       & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5225.371 &$+$0.768 & 5225.364& lab +  unid \\
           &            &        &       & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5291.420 &$-$1.047 &         & very weak\\
           &            &        &       & 106~018.643 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5363.923 &$+$0.201 & 5363.92  & lab\\
           &            &        &       & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$ & 5574.341 &$-$1.111 & 5574.25  & \\
           &            &        &       & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5637.925 &$-$0.160 & 5637.92  & \\
           &            &        &       & 109~625.200 & ($^{3}$G)4d $^{2}$G$_{9/2}$ & 6650.935 &$-$1.387 &         & blend\\
\\
124~626.900 & ($^{3}$F)4f& 3[5]  &11/2    & 103~683.070 & ($^{5}$D)5d $^{4}$F$_{9/2}$ & 4773.341 &$-$1.317 &  & \\
           &            &       &        & 103~771.320 & ($^{3}$H)4d $^{4}$G$_{9/2}$ & 4793.540 &$-$0.748 & 4793.55 & \\
           &            &       &        & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$ & 5044.081 &$-$0.396 &         & wrong, not observed\\
           &            &        &       & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$ & 5072.063 &$-$0.515 & 5072.05 & \\
           &            &        &       & 105~063.550 & ($^{3}$F)4d $^{4}$G$_{11/2}$& 5110.175 &$-$1.355 &         & blend\\
           &            &        &       & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$ & 5134.199 &$+$0.353 & 5134.20 & blend\\
           &            &        &       & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$ & 5149.000 &$-$0.004 &         & blend\\
           &            &        &       & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$ &5199.288 &$-$0.178 & 5199.29 & \\
           &            &        &       & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5233.477 &$-$0.662 & 5233.47 & computed too weak \\
           &            &        &       & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5299.732 &$-$0.158 &5299.717& lab\\
           &            &        &       & 106~018.643 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5372.464 &$-$0.223 &         & blend\\
           &            &        &       & 106~045.690 & ($^{3}$H)4d $^{2}$H$_{11/2}$ & 5380.285 &$-$0.656 &5380.29 & \\
           &            &        &       & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$ & 5395.335 &$+$0.054 & 5395.32 & computed too strong\\
           &            &        &       & 106~722.170 & ($^{3}$F)4d $^{4}$F$_{9/2}$ & 5583.566 &$-$1.347 &         & \\
           &            &        &       & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5647.362 &$-$0.074 &         & blend\\
           &            &        &       & 109~811.920 & ($^{3}$G)4d $^{4}$F$_{9/2}$ & 6748.062 &$-$1.222 &         & at the level of the noise\\
\\
124~636.116 & ($^{3}$F)4f& 3[5]  &9/2     & 103~771.320 & ($^{3}$H)4d $^{4}$G$_{9/2}$ & 4791.423 &$-$1.349 &          &at the level of the noise \\
           &            &        &       & 104~107.950 & ($^{3}$P)4d $^{4}$F$_{7/2}$ & 4869.996 &$-$1.378 &          &blend \\
           &            &        &       & 104~481.590 & ($^{3}$H)4d $^{2}$F$_{7/2}$ & 4960.280 &$-$1.109 & 4960.28  &weak \\
           &            &        &       & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$ & 5041.737 &$-$1.101 &          &weak \\
           &            &        &       & 104~873.230 & ($^{5}$D)5d $^{4}$D$_{7/2}$ & 5058.579 &$-$1.461 &          &weak \\
           &            &        &       & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$ & 5069.692 &$-$1.055 &          &weak \\
\hline 
124~636.116  & cont.     &        &       & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$ & 5089.646 &$-$0.797 &          &weak \\
            &            &        &       & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5123.331 &$-$1.032 &          & \\
           &            &        &       & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$ & 5131.770 &$-$0.298 &          &blend \\
           &            &        &       & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$ & 5146.557 &$-$0.622 &          &blend \\
           &            &        &       & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$ & 5149.085 &$+$0.286 & 5149.1   &lab \\
           &            &        &       & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5167.827.&$-$0.884 & 5167.82  &computed too weak \\
           &            &        &       & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$ &5196.797 &$-$1.467 &          &at the level of the noise \\
           &            &        &       & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5230.953 &$-$0.507 & 5230.959 &computed too weak \\
           &            &        &       & 105~589.670 & ($^{3}$F)4d $^{4}$H$_{7/2}$ & 5248.862 &$-$0.754 & 5248.801 &blend \\
           &            &        &       & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5297.144 &$-$1.481 &          &weak \\
           &            &        &       & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5300.576 &$-$0.373 &          &weak \\
           &            &        &       & 106~018.643 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5369.805 &$-$0.547 & 5369.81  & \\
           &            &        &       & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$ & 5392.652 &$-$0.592 &          &not obs, wrong \\
           &            &        &       & 106~767.210 & ($^{3}$F)4d $^{4}$F$_{7/2}$ & 5594.760 &$-$0.050 &          &not obs, wrong \\
           &            &        &       & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5636.766 &$-$0.061 & 5636.78  &computed too weak \\
           &            &        &       & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5644.423 &$-$0.918 &          &blend \\
           &            &        &       & 109~901.500 & ($^{3}$G)4d $^{2}$G$_{7/2}$ & 6784.867 &$-$1.141 &          &at the level of the noise \\
           &            &        &       & 110~167.280 & ($^{3}$G)4d $^{4}$F$_{7/2}$ & 6909.500 &$-$1.099 &          &at the level of the noise \\
\\
124~623.120 & ($^{3}$F)4f& 3[4]  &9/2     & 103~921.630 & ($^{3}$H)4d $^{4}$G$_{7/2}$ & 4829.221 &$-$1.017 & 4829.25 &computed too weak \\
           &            &        &       & 103~983.510 & ($^{3}$G)5s $^{2}$G$_{7/2}$ & 4843.700 &$-$1.308 &         &computed too strong, not obs \\
           &            &        &       & 103~986.330 & ($^{3}$H)4d $^{4}$H$_{7/2}$ & 4844.361 &$-$1.133 &         & \\
           &            &        &       & 104~916.550 & ($^{3}$H)4d $^{4}$F$_{9/2}$ & 5073.036 &$-$1.028 &         & \\
           &            &        &       & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$ & 5093.016 &$-$1.142 &5093.01  &weak \\
           &            &        &       & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5126.745 &$-$0.382 &5126.75  &lab, blend \\
           &            &        &       & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$ & 5135.196 &$-$0.318 &         &blend \\
           &            &        &       & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$ & 5150.003 &$-$0.755 &5150.02  & \\
           &            &        &       & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$ & 5152.534 &$-$1.333 &         &blend \\
           &            &        &       & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5171.301 &$+$0.425 &5171.305 & \\
           &            &        &       & 105~398.852 & ($^{3}$F)4d $^{4}$H$_{11/2}$& 5200.310 &$-$1.359 &         &blend \\
           &            &        &       & 105~449.540 & ($^{5}$D)5d $^{4}$G$_{7/2}$ & 5214.058 &$-$0.628 &         &blend \\
           &            &        &       & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5234.513 &$-$0.157 &         &blend \\
           &            &        &       & 105~763.270 & ($^{3}$F)4d $^{2}$H$_{11/2}$ & 5300.794 &$-$1.386 &        &blend \\
           &            &        &       & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5304.231 &$-$0.076 & 5304.25 &blend \\
           &            &        &       & 106~018.640 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5373.555 &$-$1.277 &         & \\
           &            &        &       & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$ & 5396.435 &$-$0.899 & 5396.45 &computed too weak \\
           &            &        &       & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5640.900 &$-$0.389 & 5640.9  &computed too strong \\
           &            &        &       & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5648.568 &$-$0.369 & 5648.57 &blend \\
           &            &        &       & 110~570.300 & ($^{3}$G)4d $^{2}$F$_{7/2}$ & 7114.048 &$-$1.243 &         & \\
\\
124~620.914 & ($^{3}$F)4f& 3[4]  &7/2     & 103~921.630 & ($^{3}$H)4d $^{4}$G$_{7/2}$ & 4829.735 &$-$1.435 &         & \\
           &            &        &       & 104~023.910 & ($^{3}$H)4d $^{4}$G$_{5/2}$ & 4853.719 &$-$0.883 &         & \\
           &            &        &       & 104~569.230 & ($^{3}$P)4d $^{4}$F$_{5/2}$ & 4985.721 &$-$0.873 &4985.72  &weak \\
           &            &        &       & 104~993.860 & ($^{3}$F)4d $^{4}$D$_{7/2}$ & 5093.588 &$-$1.437 &         &blend \\
           &            &        &       & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{5/2}$ & 5127.325 &$-$0.784 &         &blend \\
           &            &        &       & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$ & 5135.778 &$-$1.386 &         &weak \\
           &            &        &       & 105~234.237 & ($^{3}$H)4d $^{4}$F$_{5/2}$ & 5156.745 &$-$0.254 &         &blend \\
           &            &        &       & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5171.891 &$+$0.011 &5171.9 \\
           &            &        &       & 105~379.430 & ($^{3}$F)4d $^{4}$D$_{5/2}$ & 5195.658 &$-$0.478 &5195.661  &lab \\
           &            &        &       & 105~414.180 & ($^{3}$F)4d $^{4}$G$_{5/2}$ & 5205.058 &$-$0.783 &        &blend \\
           &            &        &       & 105~449.540 & ($^{5}$D)5d $^{4}$G$_{7/2}$ & 5214.658 &$-$1.042 &        &weak \\
           &            &        &       & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5235.117 &$-$1.185 &        &blend \\
           &            &        &       & 105~711.730 & ($^{5}$D)5d $^{6}$S$_{5/2}$ & 5286.964 &$-$0.934 &        &blend \\
           &            &        &       & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5304.852 &$-$0.525 &5304.87 &blend \\
           &            &        &       & 106~208.560 & ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5429.627 &$-$0.531 &5429.62 &computed too weak \\
           &            &        &       & 106~866.760 & ($^{3}$F)4d $^{4}$F$_{5/2}$ & 5630.922 &$-$1.421 &        &weak \\
           &            &        &       & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5641.602 &$-$0.724 &5641.61 &weak \\
           &            &        &       & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5649.272 &$-$1.404 &        &not observed \\
           &            &        &       & 107~407.800 & ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5807.914 &$-$0.295 &5807.9  &blend \\
\hline 
124~641.989 & ($^{3}$F)4f& 3[3]  &7/2     & 104~107.950 & ($^{3}$P)4d $^{4}$F$_{7/2}$ & 4868.603 &$-$1.393 &         & \\
           &            &        &       & 104~120.270 & ($^{5}$D)5d $^{6}$P$_{5/2}$ & 4871.525 &$-$1.423 &         & \\
           &            &        &       & 104~481.590 & ($^{3}$H)4d $^{2}$F$_{7/2}$ & 4958.835 &$-$1.370 &         &blend \\
           &            &        &       & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5121.789 &$-$0.828 &         & \\
           &            &        &       & 105~155.090 & ($^{3}$F)4d $^{4}$G$_{9/2}$ & 5130.223 &$-$0.928 &         &blend \\
           &            &        &       & 105~211.062 & ($^{5}$D)5d $^{4}$G$_{9/2}$ & 5145.002 &$-$1.290 &         &at the level of the noise \\
           &            &        &       & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$ & 5147.528 &$-$0.014 & 5147.52 & \\
           &            &        &       & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5166.258 &$-$1.096 &         &weak \\
           &            &        &       & 105~379.430 & ($^{3}$F)4d $^{4}$D$_{5/2}$ & 5189.973 &$-$0.210 &         &blend \\
           &            &        &       & 105~414.180 & ($^{3}$F)4d $^{4}$G$_{5/2}$ & 5199.353 &$-$1.041 &         &blend \\
           &            &        &       & 105~589.670 & ($^{3}$F)4d $^{4}$H$_{7/2}$ & 5247.244 &$-$0.996 & 5247.25 &weak \\
           &            &        &       & 105~711.730 & ($^{5}$D)5d $^{6}$S$_{5/2}$ & 5281.078 &$-$0.874 &         &not observed \\
           &            &        &       & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5298.926 &$-$0.405 &         &blend \\
           &            &        &       & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$ & 5390.945 &$-$1.384 &         &blend \\
           &            &        &       & 106~208.560 & ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5423.419 &$-$0.138 &5423.41  &lab \\
           &            &        &       & 106~767.210 & ($^{3}$F)4d $^{4}$F$_{7/2}$ & 5592.922 &$-$0.422 &         &wrong \\
           &            &        &       & 106~796.660 & ($^{3}$F)4d $^{4}$P$_{5/2}$ & 5602.152 &$-$0.795 &         &blend \\
           &            &        &       & 106~866.760 & ($^{3}$F)4d $^{4}$F$_{5/2}$ & 5624.245 &$-$1.195 &         &blend \\
           &            &        &       & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5634.900 &$-$0.588 &5634.9   &computed too weak \\
           &            &        &       & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5642.552 &$-$1.377 &         &at the level of the noise \\
           &            &        &       & 107~407.800 & ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5800.811 &$-$0.993 &         &at the level of the noise \\
           &            &        &       & 110~167.280 & ($^{3}$G)4d $^{4}$F$_{7/2}$ & 6906.696 &$-$1.294 &         &at the level of the noise \\
           &            &        &       & 110~611.800 & ($^{3}$G)4d $^{2}$F$_{5/2}$ & 7125.523 &$-$1.233 &          &at the level of the noise \\
\\
124~653.022 & ($^{3}$F)4f& 3[3]  &5/2     & 104~023.910 & ($^{3}$H)4d $^{4}$G$_{5/2}$ & 4846.164 &$-$1.115 & & weak \\
           &            &        &       & 104~569.230 & ($^{3}$P)4d $^{4}$F$_{5/2}$ & 4977.751 &$-$0.819 & 4977.75&computed too weak \\
           &            &        &       & 104~839.998 & ($^{3}$P)4d $^{2}$D$_{3/2}$ & 5045.778 &$-$0.981 & 5045.79 &computed too weak \\
           &            &        &       & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5118.896 &$-$1.484 & \\
           &            &        &       & 105~234.237 & ($^{3}$H)4d $^{4}$F$_{5/2}$ & 5148.219 &$-$0.286 &     &computed too strong \\
           &            &        &       & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5163.314 &$-$0.700 & 5163.29&weak \\
           &            &        &       & 105~317.440 & ($^{3}$P)4d $^{2}$P$_{3/2}$ & 5170.372 &$-$1.129 &        & \\
           &            &        &       & 105~379.430 & ($^{3}$F)4d $^{4}$D$_{5/2}$ & 5187.002 &$-$0.628 & 5187.0&\\
           &            &        &       & 105~414.180 & ($^{3}$F)4d $^{4}$G$_{5/2}$ & 5196.371 &$-$0.956 &       &blend \\
           &            &        &       & 105~460.230 & ($^{3}$F)4d $^{4}$D$_{3/2}$ & 5208.839 &$-$0.132 & 5208.862&lab, computed too strong \\
           &            &        &       & 105~711.730 & ($^{5}$D)5d $^{6}$S$_{5/2}$ & 5278.002 &$-$1.442 &  \\
           &            &        &       & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5295.829 &$-$1.021 & &blend \\
           &            &        &       & 106~208.560 & ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5420.175 &$-$0.824 &5420.2 &computed too weak \\
           &            &        &       & 106~846.650 & ($^{3}$F)4d $^{4}$F$_{3/2}$ & 5614.409 &$-$0.773 &       &computed too strong \\
           &            &        &       & 107~065.930 & ($^{3}$F)4d $^{4}$P$_{3/2}$ & 5684.411 &$-$1.018 &       & \\
           &            &        &       & 107~407.800 & ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5797.100 &$-$0.273 &5797.1& \\
           &            &        &       & 107~430.250 & ($^{3}$F)4d $^{2}$D$_{3/2}$ & 5804.657 &$-$0.981 & &at the level of the noise \\
           &            &        &       & 108~105.900 & ($^{3}$F)4d $^{2}$P$_{3/2}$ & 6041.674 &$-$0.519 &      & \\
\\
124~731.762 & ($^{3}$F)4f & 3[0] & 1/2 & 104~189.380 & ($^{5}$D)5d $^{4}$P$_{3/2}$ & 4866.625 &$-$0.710 & & on the H$_{\beta}$ wing \\
           &             &      &     & 104~588.710 & ($^{5}$D)5d $^{6}$D$_{3/2}$ & 4963.106 &$-$1.473 & &  \\
           &             &      &     & 104~736.460 & ($^{3}$P)4d $^{2}$P$_{1/2}$ & 4999.780 &$-$1.476 & &  \\
           &             &      &     & 105~460.230 & ($^{3}$F)4d $^{4}$D$_{3/2}$ & 5187.556 &$-$1.137 & &  \\
           &             &      &     & 105~477.920 & ($^{3}$F)4d $^{4}$D$_{1/2}$ & 5192.323 &$-$0.902 & & blend  \\
           &             &      &     & 105~518.140 & ($^{3}$H)4d $^{4}$F$_{3/2}$ & 5203.192 &$-$0.854 & & blend \\
           &             &      &     & 107~065.930 & ($^{3}$F)4d $^{4}$P$_{3/2}$ & 5659.074 &$-$0.650 & 5659.05 & computed too weak  \\
           &             &      &     & 107~176.100 & ($^{5}$D)5d $^{4}$P$_{1/2}$ & 5694.588 &$-$0.810 & 5694.59 & good agreement \\
           &             &      &     & 107~430.250 & ($^{3}$F)4d $^{2}$D$_{3/2}$ & 5778.239 &$-$0.939 & & blend  \\
           &             &      &     & 108~105.900 & ($^{3}$F)4d $^{2}$P$_{3/2}$ & 6013.060 &$-$1.184 & &  \\
\hline 
124~803.873 & ($^{3}$F)4f& 2[5]  &11/2 & 103~771.320 & ($^{3}$H)4d $^{4}$G$_{9/2}$ & 4753.206 &$-$1.359 & &  \\
           &            &       &     & 104~807.210 & ($^{3}$H)4d $^{2}$G$_{9/2}$ & 4999.441 &$-$1.315 & &  \\
           &            &       &        & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5185.437 &$+$0.377 &5185.422 & lab \\
           &            &       &         & 106~018.643 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5321.852 &$+$0.731 &5321.83 & lab \\
           &            &       &         & 106~097.520 & ($^{3}$H)4d $^{2}$H$_{9/2}$ & 5344.292 &$-$1.008 &5344.28 & \\
           &            &       &         & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5591.464 &$-$0.173 & & computed too strong \\
           &            &       &         & 109~625.200 & ($^{3}$G)4d $^{2}$G$_{9/2}$ & 6586.373 &$-$1.344 & & not observed \\
\\
124~809.727 & ($^{3}$F)4f& 2[5]  &9/2     & 103~921.630 & ($^{3}$H)4d $^{4}$G$_{7/2}$ & 4786.078 &$-$1.434& \\ 
           &            &       &        & 103~983.510 & ($^{3}$G)5s $^{2}$G$_{7/2}$ & 4800.298 &$-$1.342 & &  \\
           &            &       &        & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5121.860 &$-$1.107 & & blend \\
           &            &       &        & 105~449.540 & ($^{5}$D)5d $^{4}$G$_{7/2}$ & 5163.801 &$-$1.335 & & blend \\
           &            &       &        & 105~524.461 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5183.862 &$-$1.227 & & blend \\
           &            &       &        & 105~589.670 & ($^{3}$F)4d $^{4}$H$_{7/2}$ & 5201.450 &$+$0.802 &5201.444 & lab \\
           &            &       &        & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5252.229 &$-$1.121 & &  \\
           &            &       &        & 106~018.643 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5320.193 &$-$0.866 & & blend \\
           &            &       &        & 106~767.210 & ($^{3}$F)4d $^{4}$F$_{7/2}$ & 5540.925 &$-$1.367 & &  \\
           &            &       &        & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5582.123 &$-$0.405 &5582.12  \\
\par
\\
124~793.905 & ($^{3}$F)4f& 2[4]  &9/2     & 103~921.630 & ($^{3}$H)4d $^{4}$G$_{7/2}$ & 4789.706 &$-$1.174& 4789.7 & computed too weak \\ 
           &            &       &        & 103~986.330 & ($^{3}$H)4d $^{4}$H$_{7/2}$ & 4804.599 &$-$1.426 & &blend  \\
           &            &       &        & 104~481.590 & ($^{3}$H)4d $^{2}$F$_{7/2}$ & 4921.748 &$-$1.081 & &blend \\
           &            &       &        & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5082.234 &$-$0.341 & &blend \\
           &            &       &        & 105~220.600 & ($^{3}$H)4d $^{4}$F$_{7/2}$ & 5107.576 &$-$0.574 & &blend \\
           &            &       &        & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5126.016 &$+$0.065 & 5126.00 & lab.\\
           &            &       &        & 105~449.540 & ($^{5}$D)5d $^{4}$G$_{7/2}$ & 5168.025 &$-$1.175 & &good agreement \\
           &            &       &        & 105~524.460 & ($^{3}$F)4d $^{4}$H$_{9/2}$ & 5188.118 &$-$0.544 & 5188.12 & good agreement \\
           &            &       &        & 105~589.670 & ($^{3}$F)4d $^{4}$H$_{7/2}$ & 5205.735 &$-$0.340 & & blend \\
           &            &       &        & 105~775.491 & ($^{3}$F)4d $^{2}$F$_{7/2}$ & 5256.599 &$-$0.442 &5256.599 & good agreement \\
           &            &       &        & 106~018.640 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5324.675 &$-$0.131 &5234.68 & good agreementy= \\
           &            &       &        & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5587.059 &$+$0.466 & & blend\\
           &            &       &        & 106~924.430 & ($^{3}$F)4d $^{2}$G$_{9/2}$ & 5594.582 &$-$1.114 & & blend\\
           &            &       &        & 109~901.500 & ($^{3}$G)4d $^{2}$G$_{7/2}$ & 6712.979 &$-$1.436 & & \\
           &            &       &        & 110~167.280 & ($^{3}$G)4d $^{4}$F$_{7/2}$ & 6834.961 &$-$1.262 & & \\
           &            &       &        & 110~570.300 & ($^{3}$G)4d $^{2}$F$_{7/2}$ & 7028.628 &$-$1.389 & & \\
\\
124~783.748 & ($^{3}$F)4f& 2[4]  &7/2     & 104~023.910 & ($^{3}$H)4d $^{4}$G$_{5/2}$ & 4815.647 &$-$0.780 & &not observed \\
           &            &       &        & 104~120.270 & ($^{5}$D)5d $^{6}$P$_{5/2}$ & 4838.105 &$-$1.439 & & \\
           &            &       &        & 104~209.610 & ($^{3}$H)4d $^{2}$F$_{5/2}$ & 4859.114 &$-$1.499 & &  \\
           &            &       &        & 104~569.230 & ($^{3}$P)4d $^{4}$F$_{5/2}$ & 4945.559 &$-$1.176 & & weak \\
           &            &       &        & 105~123.000 & ($^{3}$H)4d $^{2}$G$_{7/2}$ & 5084.859 &$-$1.401 & &  \\
           &            &       &        & 105~291.010 & ($^{3}$F)4d $^{4}$G$_{7/2}$ & 5128.687 &$-$0.876 & & blend \\
           &            &       &        & 105~414.180 & ($^{3}$F)4d $^{4}$G$_{5/2}$ & 5161.300 &$+$0.512 &5161.3 &lab, computed too strong \\
           &            &       &        & 105~589.670 & ($^{3}$F)4d $^{4}$H$_{7/2}$ & 5208.490 &$-$0.196 &5208.501 & \\
           &            &       &        & 105~630.750 & ($^{5}$D)5d $^{4}$G$_{5/2}$ & 5219.661 &$-$0.923 & & blend \\
           &            &       &        & 106~018.640 & ($^{3}$F)4d $^{2}$H$_{9/2}$ & 5327.557 &$-$1.482 &  & \\
           &            &       &        & 106~208.560 & ($^{3}$F)4d $^{2}$F$_{5/2}$ & 5382.029 &$-$0.281 &5382.12 & \\
           &            &       &        & 106~900.370 & ($^{3}$F)4d $^{2}$G$_{7/2}$ & 5590.233 &$-$0.326 &5590.22 & \\
           &            &       &        & 107~407.800 & ($^{3}$F)4d $^{2}$D$_{5/2}$ & 5753.486 &$-$0.930 & & at the level of the noise \\
           &            &       &        & 110~611.800 & ($^{3}$G)4d $^{2}$F$_{5/2}$ & 7054.248 &$-$1.377 & & at the level of the noise \\
\hline 
\end{tabular} 
\end{table}