\begin{table}%t1
\scriptsize
%\centering
\par
\caption{\label{table1}Spectral properties during the initial outburst phase.} 
\vskip 0.0cm
\begin{tabular}{lccccc}
\hline\hline\noalign{\smallskip}
Obs. Id\tablefootmark{*} & UT & Photon & \multicolumn{2}{c}{Flux\tablefootmark{\dagger}} & $\chi^2$/d.o.f.\tablefootmark{**}  \\
\cline{4-5}
& Date    &  Index($\Gamma$) & 3--10~keV & 10--25~keV &   \\
\hline
X-10-05&2010-03-17&1.473&2.533&2.868&39.92/48 \\
%\hline
X-13-02&2010-04-05&1.504&2.405&2.545&55.13/48 \\
%\hline
X-14-06&2010-04-13&2.073&6.495&3.637&43.84/48 \\
%\hline
X-15-00&2010-04-16&2.185&3.446&1.390&68.51/48 \\
%\hline
X-16-04&2010-04-28&2.613&6.238&0.658&56.74/48 \\
\hline
\end{tabular}
\tablefoot{\tablefoottext{\dagger}{Flux in unit of $10^{-9}$~erg~cm$^{-2}$~s$^{-1}$.} \tablefoottext{*}{Here, $X=95409{-}01$.} \tablefoottext{**}{d.o.f. means no. of degrees of freedom.}}
\end{table}