\begin{table}%t3
%\centering
\par
\caption{\label{62620_tab}Same as Table~\ref{88308_tab} but for parameters of the fit to CoRoT 102762620.}
\vspace*{-2mm}
\begin{tabular}{cccccc}
\hline\hline\noalign{\smallskip}
Frequency & Linewidth  & Height  & $H/B$ & Amplitude & Lifetime\\
 $\mu$Hz  &  $\mu$Hz & 10$^5$ ppm$^2$$\mu$Hz$^{-1}$ & & ppm & days\\
\hline
17.7 $\pm$ 0.2 & 0.14 $\pm$ 0.03 & 0.7 $\pm$ 0.1 & 4.5 & 54 $\pm$ 17 & $\rm 40.9^{+57.7}_{-16.3}$ \\
18.9 $\pm$ 0.2 & 0.13 $\pm$ 0.01 & 0.24 $\pm$ 0.03 & 17.6 & 98 $\pm$ 24 & $\rm 58.3^{+27.7}_{-17.4}$\\
20.37 $\pm$ 0.07 & 0.041 $\pm$ 0.004 & 1.4 $\pm$ 0.1 & 50.6 & 136 $\pm$ 30 & $>$100\\
21.7 $\pm$ 0.2 & 0.13 $\pm$ 0.01 & 0.37 $\pm$ 0.03 & 47.2 & 124 $\pm$ 26 & $\rm 58.3^{+27.7}_{-17.4}$\\
23.1 $\pm$ 0.1 & 0.3 $\pm$ 0.3 & 0.10 $\pm$ 0.06 & 19.8 & 89 $\pm$ 77 & $\rm 8.1^{+ 91.9}_{-7.2}$\\
24.0 $\pm$ 0.1 & 0.13 $\pm$ 0.06 & 0.10 $\pm$ 0.03 & 12.5 & 63 $\pm$ 27 & $\rm 58.3^{+ 41.7}_{-38.7}$\\
24.40 $\pm$ 0.07 & 0.07 $\pm$ 0.01 & 0.13 $\pm$ 0.02 & 12.8 & 53 $\pm$ 13 & $>$100\\
25.8 $\pm$ 0.6 & 0.241 $\pm$ 0.005 & 0.047 $\pm$ 0.006 & 8.0 & 59 $\pm$ 21 & $\rm 12.4^{+0.5}_{-0.5}$\\
26.9 $\pm$ 0.3 & 0.38 $\pm$ 0.06 & 0.05 $\pm$ 0.03 & 14.8 & 79 $\pm$ 57 & $\rm 4.8^{+2.3}_{-1.6}$\\
\hline
\end{tabular}
%\vspace*{3mm}
\end{table}