\begin{table}%t2
\caption{\label{88308_tab}Parameters for the fit to CoRoT 102788308. }
%\centering
\par
\begin{tabular}{cccccc}
\hline\hline\noalign{\smallskip}
Frequency & Linewidth  & Height  & $H/B$ & Amplitude & Lifetime\\
 $\mu$Hz  &  $\mu$Hz & 10$^5$ ppm$^2$$\mu$Hz$^{-1}$ & & ppm & days\\
\hline\noalign{\smallskip}
42.3 $\pm$ 0.1 & 0.15 $\pm$ 0.02 & 0.048 $\pm$ 0.007 & 11.0 & 46 $\pm$ 13 & $\rm 33.2^{+25.1}_{-8.6}$\\
45.00 $\pm$ 0.06 & 0.083 $\pm$ 0.004 & 0.132 $\pm$ 0.009 & 24.2 & 59 $\pm$ 10 & $>$100\\
47.43 $\pm$ 0.06 & 0.175 $\pm$ 0.009 & 0.096 $\pm$ 0.006 & 32.0 & 73 $\pm$ 13 & $\rm 23.2^{+2.8}_{-2.3}$\\
50.21 $\pm$ 0.04 & 0.097 $\pm$ 0.005 & 0.18 $\pm$ 0.01 & 55.6 & 74 $\pm$ 13 & $>$100\\
52.66 $\pm$ 0.06 & 0.137 $\pm$ 0.007 & 0.106 $\pm$ 0.007 & 32.7 & 67 $\pm$ 12 & $\rm 44.4^{+13.9}_{-7.0}$\\
55.5 $\pm$ 0.1 & 0.17 $\pm$ 0.01 & 0.040 $\pm$ 0.004 & 20.9 & 47 $\pm$ 10 & $\rm 24.7^{+3.6}_{-2.8}$\\
57.2 $\pm$ 0.2 & 0.3 $\pm$ 0.2 & 0.023 $\pm$ 0.002 & 9.1 & 49 $\pm$  36 & $\rm 8.1^{+91.9}_{-6.0}$\\
60.8 $\pm$ 0.1 & 0.27 $\pm$ 0.02 & 0.017 $\pm$ 0.001 & 9.5 & 38 $\pm$ 8 & $\rm 10.0^{+1.6}_{-1.3}$\\
63.33 $\pm$ 0.08 & 0.21 $\pm$ 0.04 & 0.01 $\pm$ 0.01 &10.9 & 33 $\pm$ 23 & $\rm 16.1^{+8.5}_{-4.6}$\\
\hline
\end{tabular}
\tablefoot{The frequencies, linewidth and height are fitted parameters, the height-to-background ratio ($H/B$) is measured as the observed height of the oscillation mode in the power spectrum over the fitted background. The amplitudes and ``unbiased'' lifetimes are derived from the fitted parameters as described in the text.}
\end{table}