\begin{table}%t10
\caption{\label{tab10}Scargle power and False Alarm Probability for the Peak at~1.17~c~d$^{-1}$, for
RV, bisector, and Ca~II data. }
%\centering
\begin{tabular}{ccc}
\hline\hline\noalign{\smallskip}
Data  & Scargle  power & FAP \\
\hline 
RV~    & 5.32 & 0.0049 \\
Bisector & 2.09  & 0.12 \\
Ca~II  &  2.08   &  0.12  \\
\hline
\end{tabular}
\tablefoot{No peak  could be found near 
1.17~c~d$^{-1}$ in the Scargle periodogram of the {\it FWHM} data. }
\end{table}