\begin{table}%t1
	  \caption{Coordinates and magnitudes of CoRoT-8 and its six main
	  contaminants.}
      \label{tab:exodat}
      %\centering
\par
      \begin{tabular}{l ccccccc}
      \hline\hline\noalign{\smallskip}
      Star & RA (deg) & DE (deg) & $X$ & $Y$ & $V$ & $r'$ \\
      \hline
      CoRoT-8 & 291.58852 & 1.42646 & 924 & 741 & 14.8 & 14.3 \\
      Cont. \#1 & 291.58839 & 1.42976 & 929 & 739 & 18.8 & 18.3 \\
      Cont. \#2 & 291.58826 & 1.42280 & 919 & 744 & 19.1 & 18.8 \\
      Cont. \#3 & 291.58652 & 1.42269 & 920 & 746 & 20.7 & 20.1 \\
      Cont. \#4 & 291.59267 & 1.42809 & 924 & 734 & 20.7 & 20.1 \\
      Cont. \#5 & 291.58967 & 1.43077 & 929 & 737 & 19.0 & 18.6 \\
      Cont. \#6 & 291.58537 & 1.42313 & 921 & 748 & 20.3 & 19.7 \\
      \hline
      \end{tabular}
      \tablefoot{$X$ and $Y$ are positions on CCD E2 in pixels. $V$ and $r'$
	  are the magnitudes in the Harris $V$ and Sloan-Gunn $r'$ filters.}
   \end{table}