\begin{table}%t2
\caption{\label{WASP26-params}Stellar parameters of WASP-26.}
%\centerline
{\small
\begin{tabular}{lc} 
\hline\hline
Parameter      & Value \\ 
\hline\\[-3.25mm]
RA (J2000.0)   & 00$^{\rm h}$18$^{\rm m}$24.70$^{\rm s}$ \\
Dec (J2000.0)  & $-$15{\degr}16{\arcmin}02.3{\arcsec} \\
$V$ {mag}     & 11.3 \\
$T_{\rm eff}$  & 5950 $\pm$ 100 K \\
$\log g$       & 4.3 $\pm$ 0.2 \\
$\xi_{\rm t}$  & 1.2 $\pm$ 0.1 km~s$^{-1}$ \\
$v \sin i$     & 2.4 $\pm$ 1.3 km~s$^{-1}$ \\
{[Fe/H]}       &$-$0.02 $\pm$ 0.09 \\
{[Si/H]}       &  +0.07 $\pm$ 0.09 \\
{[Ca/H]}       &  +0.08 $\pm$ 0.12 \\
{[Ti/H]}       &  +0.03 $\pm$ 0.06 \\
{[Ni/H]}       &   0.00 $\pm$ 0.06 \\
log $A$(Li)      &   1.90 $\pm$ 0.12 \\
Spectral Type  & G0 \\
$M_{\star}$    & 1.12 $\pm$ 0.03  $M_{\sun}$ \\
$R_{\star}$    & 1.34 $\pm$ 0.06  $R_{\sun}$ \\
$\rho_{\star}$ & 0.47 $\pm$ 0.06 $\rho_{\sun}$ \\
\hline
\end{tabular}}
\tablefoot{The spectral type was estimated from Table~B.1 of
\citet{2008oasp.book.....G} and $M_{\star}$, $R_{\star}$ and $\rho_{\star}$ are
from the MCMC analysis (Sect.~\ref{MCMC}).}\vspace*{-2mm}
\end{table}