\begin{table}%tB.3%tB.4
\caption{\label{SpecVarFTabRight}Integral flux ($10^{-11}~\percmsqrs$) in the 0.2$-$1~TeV energy range versus photon index corresponding to the right panel of Fig.~\ref{SpecVar20052007_mix}.} 
\par
%\centering
\par
 { {\begin{tabular}{*{2}{c}}
\hline \hline \noalign{\smallskip}
$\Phi$ & Index $\Gamma$ \\ 
\hline
$4.2\pm0.1$ & $3.52\pm 0.07$ \\
$17.3\pm0.5$ & $3.89\pm 0.09$ \\
$38.6\pm1.1$ & $3.80\pm 0.08$ \\
$43.6\pm1.1$ & $3.60\pm 0.07$ \\
$51.5\pm1.3$ & $3.53\pm 0.07$ \\
$67.2\pm1.9$ & $3.64\pm 0.07$ \\
$86.1\pm1.9$ & $3.38\pm 0.06$ \\
$97.0\pm1.9$ & $3.30\pm 0.05$ \\
$111.7\pm3.0$ & $3.33\pm 0.07$ \\
$154.1\pm3.5$ & $3.28\pm 0.06$ \\
$173.1\pm3.8$ & $3.16\pm 0.06$ \\
$198.5\pm3.8$ & $3.28\pm 0.05$ \\
$210.9\pm3.9$ & $3.14\pm 0.04$ \\
\hline
\end{tabular}}}
\tablefoot{Errors are statistical. See Sect.~\ref{SpecVarAll} for more details.}
\end{table}