\begin{table}%t1
%\centering
\par
\caption{\label{table1}Values of $q$ and $f$ as obtained by considering the full  2PCFs, and by using the COSEBIs $E^{\rm lin}$, and $E^{\rm log}$}
\par
\label{tab:q-f-values}
\begin{tabular}{l l l l l}
\hline \hline
\noalign{\smallskip}
Measure & $\vt_{\rm min}$ & $\vt_{\rm max}$ & $q$ &$f$  \\ 
\hline
2PCF & 1\arcmin & 400\arcmin & 22.10 & 7.51 \\
$E^{\rm lin}_{30}$ & 1\arcmin & 400\arcmin & 28.68 & 8.85 \\
$E^{\rm log}_{10}$ & 1\arcmin & 400\arcmin & 27.04 & 8.66 \\
\\
2PCF & 1\arcmin & 20\arcmin & 31.28 & 9.54 \\
$E^{\rm lin}_ {15}$ & 1\arcmin & 20\arcmin & 422.79 & 74.21 \\
$E^{\rm log}_{10}$ & 1\arcmin & 20\arcmin  & 418.09 & 77.35 \\
\\
2PCF & 2\arcmin & 400\arcmin & 25.46 & 8.37 \\
$E^{\rm log}_{10}$ & 2\arcmin & 400\arcmin & 39.65 & 11.91\\
\hline 
\end{tabular}
\end{table}