\begin{table}%t6
\caption{\label{Table:Linesflux4}Reddening-corrected line ratios, normalized to \Hb$^{(*)}$.}
\small%\centering
\par
\begin{tabular}{llcccccccc}       
\hline\hline\noalign{\smallskip} 
$\lambda$  & Ion  & \multicolumn{4}{c}{IZw~123} &
                    \multicolumn{4}{c}{IZw~159} \\    
           &      & \multicolumn{2}{c}{Nuclear} & 
	            \multicolumn{2}{c}{Integrated} &
                    \multicolumn{2}{c}{Nuclear} & 
		    \multicolumn{2}{c}{Integrated} \\
           &      &    $F_{\lambda}$  &  $-W_{\lambda}$ & 
	               $F_{\lambda}$  &  $-W_{\lambda}$ &
                       $F_{\lambda}$  &  $-W_{\lambda}$ & 
		       $F_{\lambda}$  &  $-W_{\lambda}$ \\  
\hline
3727 &  [\ion{O}{ii}]    &  
                      $1.75\pm0.17$  &  $ 55.3\pm2.9$  &  % I Zw 123 nuclear  
		      $2.17\pm0.34$  &  $ 37.3\pm4.6$  &  % I Zw 123 Integr
                      $3.10\pm0.27$  &  $ 79.7\pm3.7$  &  % I Zw 159 nuclear  
		      $3.60\pm0.49$  &  $ 87.4\pm9.7$  \\ % I Zw 159 Integr
3869 &  [\ion{Ne}{iii}]    &  
                      $0.54\pm0.05$  &  $ 22.8\pm1.6$  &  % I Zw 123 nuclear    
		      $0.47\pm0.15$  &  $ 13.6\pm4.3$  &  % I Zw 123 Integr
                      $0.27\pm0.05$  &  $  6.5\pm1.1$  &  % I Zw 159 nuclear   
		      --            &    --            \\ % I Zw 159 Integr
3889 &  H8+HeI      &  
                      $0.11\pm0.02$  &  $  4.9\pm1.0$  &  % I Zw 123 nuclear   
		      --            &  --	       &  % I Zw 123 Integr
                      --            &  --            &  % I Zw 159 nuclear  
		      --            &  --            \\ % I Zw 159 Integr
3968 &  [\ion{Ne}{iii}]  &  
                      $0.26\pm0.02$  &  $ 11.5\pm0.8$  &  % I Zw 123 nuclear  
		      --            &   --           &  % I Zw 123 Integr
                      --            &   --           &  % I Zw 159 nuclear  
		      --            &   --	       \\ % I Zw 159 Integr
4101 & H$\delta$         &  
                      $0.26\pm0.01$  &  $ 12.1\pm0.5$  &  % I Zw 123 nuclear   
		      --            &  --	       &  % I Zw 123 Integr
                      $0.26\pm0.02$  &  $  6.7\pm0.4$  &  % I Zw 159 nuclear  
		      --            &  --	       \\ % I Zw 159 Integr
4340 & H$\gamma$         &  
                      $0.47\pm0.02$  &  $ 25.8\pm0.5$  &  % I Zw 123 nuclear    
		      $0.39\pm0.04$  &  $ 14.6\pm1.3$  &  % I Zw 123 Integr
                      $0.47\pm0.02$  &  $ 13.6\pm0.4$  &  % I Zw 159 nuclear   
		      $0.47\pm0.03$  &  $  9.7\pm0.6$  \\ % I Zw 159 Integr
4363 & [\ion{O}{iii}]    &  
                      $0.07\pm0.01$  &  $  3.9\pm0.4$  &  % I Zw 123 nuclear    
		      --            &  --            &  % I Zw 123 Integr
                      --            &  --            &  % I Zw 159 nuclear    
		      --            &  --            \\ % I Zw 159 Integr
4471 &  \ion{He}{i}      &
                      $0.06\pm0.01$  &  $  3.4\pm0.5$  &  % I Zw 123 nuclear    
		      --            &  --            &  % I Zw 123 Integr
                      --            &  --            &  % I Zw 159 nuclear   
		      --            &  --            \\ % I Zw 159 Integr
4861 & H$\beta$          &  
                      $1.00\pm0.00$  &  $ 66.7\pm0.5$  &  % I Zw 123 nuclear   
		      $1.00\pm0.00$  &  $ 44.8\pm1.6$  &  % I Zw 123 Integr
                      $1.00\pm0.00$  &  $ 33.5\pm0.3$  &  % I Zw 159 nuclear  
		      $1.00\pm0.00$  &  $ 24.4\pm0.6$  \\ % I Zw 159 Integr
\par
4959 & [\ion{O}{iii}]    &  
                      $1.93\pm0.05$  &  $131.2\pm0.6$  &  % I Zw 123 nuclear   
		      $1.69\pm0.09$  &  $ 73.7\pm1.8$  &  % I Zw 123 Integr
                      $0.93\pm0.02$  &  $ 31.4\pm0.3$  &  % I Zw 159 nuclear  
		      $0.87\pm0.03$  &  $ 19.3\pm0.4$  \\ % I Zw 159 Integr
5007 &  [\ion{O}{iii}]   &  
                      $5.78\pm0.14$  &  $406.7\pm1.0$  &  % I Zw 123 nuclear   
		      $5.14\pm0.24$  &  $226.8\pm2.8$  &  % I Zw 123 Integr
                      $2.78\pm0.07$  &  $ 95.0\pm0.4$  &  % I Zw 159 nuclear  
		      $2.66\pm0.09$  &  $ 61.0\pm0.6$  \\ % I Zw 159 Integr
5876 &  \ion{He}{i}      &  
                      $0.09\pm0.01$  &  $  9.5\pm0.3$  &  % I Zw 123 nuclear    
		      --            &  --            &  % I Zw 123 Integr
                      $0.11\pm0.01$  &  $  4.7\pm0.2$  &  % I Zw 159 nuclear  
		      $0.10\pm0.01$  &  $  3.2\pm0.5$  \\ % I Zw 159 Integr
6300 & [\ion{O}{i}]    &   
                      --            &  --            &  % I Zw 123 nuclear    
		      --            &  --            &  % I Zw 123 Integr
                      $0.07\pm0.01$  &  $  3.7\pm0.3$  &  % I Zw 159 nuclear  
		      $0.09\pm0.02$  &  $  3.2\pm0.7$  \\ % I Zw 159 Integr
6548 &  [\ion{N}{ii}]    &  
                      --            &  --            &  % I Zw 123 nuclear    
		      --            &  --            &  % I Zw 123 Integr
                      $0.14\pm0.01$  &  $  7.8\pm0.2$  &  % I Zw 159 nuclear  
		      --            &  --            \\ % I Zw 159 Integr
6563 & H$\alpha$         &  
                      $2.85\pm0.07$  &  $323.3\pm1.4$  &  % I Zw 123 nuclear   
		      $2.86\pm0.19$  &  $204.1\pm3.4$  &  % I Zw 123 Integr
                      $2.86\pm0.07$  &  $153.5\pm0.5$  &  % I Zw 159 nuclear  
		      $2.85\pm0.11$  &  $104.5\pm1.0$  \\ % I Zw 159 Integr
6584 &  [\ion{N}{ii}]    &  
                      $0.14\pm0.01$  &  $ 15.9\pm0.6$  &  % I Zw 123 nuclear   
		      $0.16\pm0.02$  &  $ 11.2\pm1.4$  &  % I Zw 123 Integr
                      $0.35\pm0.01$  &  $ 18.8\pm0.3$  &  % I Zw 159 nuclear  
		      $0.38\pm0.02$  &  $ 13.9\pm0.8$  \\ % I Zw 159 Integr
6678 &  \ion{He}{i}      &
                      $0.03\pm0.01$  &  $  4.2\pm0.5$  &  % I Zw 123 nuclear   
		      --            &  --            &  % I Zw 123 Integr
                      $0.03\pm0.01$  &  $  1.6\pm0.2$  &  % I Zw 159 nuclear  
		      --            &  --            \\ % I Zw 159 Integr
6717 & [\ion{S}{ii}]     & 
                      $0.14\pm0.01$  &  $ 16.8\pm0.5$  &  % I Zw 123 nuclear   
		      $0.23\pm0.03$  &  $ 17.3\pm1.8$  &  % I Zw 123 Integr
                      $0.34\pm0.01$  &  $ 18.5\pm0.3$  &  % I Zw 159 nuclear  
		      $0.41\pm0.02$  &  $ 15.3\pm0.6$  \\ % I Zw 159 Integr
6731 & [\ion{S}{ii}]     & 
                      $0.12\pm0.01$  &  $ 14.6\pm0.6$  &  % I Zw 123 nuclear   
		      $0.17\pm0.03$  &  $ 12.7\pm1.7$  &  % I Zw 123 Integr
                      $0.26\pm0.01$  &  $ 14.2\pm0.3$  &  % I Zw 159 nuclear  
		      $0.30\pm0.02$  &  $ 11.3\pm0.6$  \\ % I Zw 159 Integr
      &          &  
                    \multicolumn{2}{c}{ $F(\Hb)=1263.3\pm 47.9 $}   &   % Izw123 nucl 
                    \multicolumn{2}{c}{$F(\Hb)=1743.4\pm279.3 $}   &   % Izw123 inte 
                    \multicolumn{2}{c}{ $F(\Hb)= 593.7\pm 20.3 $}   &   % Izw159 nucl 
                    \multicolumn{2}{c}{$F(\Hb)= 751.6\pm 46.4$}    \\  % Izw159 inte
      &          &              
                    \multicolumn{2}{c}{ $\CHbeta=0.201\pm0.014$}     &   % Izw123 nucl
                    \multicolumn{2}{c}{$\CHbeta=0.188\pm0.067$}     &   % Izw123 inte
                    \multicolumn{2}{c}{ $\CHbeta=0.238\pm0.013$}     &   % Izw159 nucl
                    \multicolumn{2}{c}{$\CHbeta=0.248\pm0.024$}     \\  % Izw159 inte
     &          &              
                    \multicolumn{2}{c}{ $\EBV=0.139\pm0.010$}     &   % Izw123 nucl  
                    \multicolumn{2}{c}{$\EBV=0.130\pm0.047$}     &   % Izw123 inte  
                    \multicolumn{2}{c}{ $\EBV=0.164\pm0.010$}     &   % Izw159 nucl  
                    \multicolumn{2}{c}{$\EBV=0.171\pm0.016$}     \\  % Izw159 inte
\hline
\end{tabular}
\end{table}