\begin{table}%t5
\caption{\label{Table:Linesflux3}Reddening-corrected line ratios, normalized to \Hb$^{(*)}$.}
\small%\centering
\par
\begin{tabular}{llcccccccccccc}       
\hline\hline\noalign{\smallskip}
$\lambda$  & Ion  & \multicolumn{8}{c}{Tololo~1434+032} &		           
                    \multicolumn{4}{c}{Mrk~475} \\    
           &      & \multicolumn{2}{c}{Knot A}  & 
	            \multicolumn{2}{c}{Knot B}   & 
		    \multicolumn{2}{c}{Knot CD}  & 
		    \multicolumn{2}{c}{Integrated} &
                    \multicolumn{2}{c}{Nuclear} & 
		    \multicolumn{2}{c}{Integrated} \\
           &      &   $F_{\lambda}$  & $-W_{\lambda}$  & 
	              $F_{\lambda}$  & $-W_{\lambda}$  &   
		      $F_{\lambda}$  & $-W_{\lambda}$  & 
		      $F_{\lambda}$  & $-W_{\lambda}$  &
                      $F_{\lambda}$  & $-W_{\lambda}$  & 
		      $F_{\lambda}$  & $-W_{\lambda}$ \\  
\hline
3727 &  [\ion{O}{ii}]    &  
                      $2.19\pm0.22$  &  $153.4\pm  8.9$  &  % Tol 1434 Knot A 
		      $2.87\pm0.43$  &  $123.5\pm 13.6$  &  % Tol 1434 Knot B  
		      $3.94\pm1.28$  &  $490.1\pm145.9$  &  % Tol 1434 Knot CD 
		      $3.05\pm0.71$  &  $ 64.7\pm 13.1$  &  % Tol 1434 Integr
                      $1.29\pm0.12$  &  $107.5\pm  5.6$  &  % Mrk 475  Knot A 
		      $1.42\pm0.28$  &  $139.4\pm 24.4$  \\ % Mrk 475  Integr
 3869 &  [\ion{Ne}{iii}]    &  
                      $0.43\pm0.05$  &  $ 17.1\pm  1.5$  &  % Tol 1434 Knot A  
		      $0.44\pm0.11$  &  $ 13.1\pm  3.1$  &  % Tol 1434 Knot B 
		      --            &  --              &  % Tol 1434 Knot CD   
		      $0.68\pm0.19$  &  $ 11.3\pm  3.0$  &  % Tol 1434 Integr
                      $0.41\pm0.03$  &  $ 44.0\pm  2.3$  &  % Mrk 475  Knot A   
		      $0.47\pm0.09$  &  $ 51.3\pm  9.2$  \\ % Mrk 475  Integr
3889 &  H8+HeI      &  
                      $0.16\pm0.03$  &  $  7.4\pm  1.3$  &  % Tol 1434 Knot A    
		      --            &  --              &  % Tol 1434 Knot B  
		      --            &  --              &  % Tol 1434 Knot CD   
		      --            &  --              &  % Tol 1434 Integr
                      $0.18\pm0.02$  &  $ 19.6\pm  1.8$  &  % Mrk 475  Knot A   
		      --            &  --              \\ % Mrk 475  Integr
3968 &  [\ion{Ne}{iii}]  &  
                      $0.24\pm0.03$  &  $ 12.1\pm  1.4$  &  % Tol 1434 Knot A   
		      $0.24\pm0.07$  &  $  9.6\pm  2.8$  &  % Tol 1434 Knot B 
		      --            &  --              &  % Tol 1434 Knot CD   
		      --            &  --              &  % Tol 1434 Integr
                      $0.27\pm0.02$  &  $ 30.2\pm  1.4$  &  % Mrk 475  Knot A   
		      --            &  --              \\ % Mrk 475  Integr
4101 & H$\delta$         &  
                      $0.27\pm0.02$  &  $ 11.7\pm  0.9$  &  % Tol 1434 Knot A   
		      $0.27\pm0.05$  &  $  8.1\pm  1.4$  &  % Tol 1434 Knot B 
		      --            &  --              &  % Tol 1434 Knot CD   
		      --            &  --              &  % Tol 1434 Integr
                      $0.27\pm0.01$  &  $ 28.6\pm  0.7$  &  % Mrk 475  Knot A   
		      $0.23\pm0.03$  &  $ 18.7\pm  2.3$  \\ % Mrk 475  Integr
4340 & H$\gamma$         &  
                      $0.48\pm0.03$  &  $ 27.3\pm  1.2$  &  % Tol 1434 Knot A   
		      $0.50\pm0.05$  &  $ 22.1\pm  2.1$  &  % Tol 1434 Knot B 
		      $0.59\pm0.10$  &  $  8.1\pm  1.2$  &  % Tol 1434 Knot CD  
		      $0.60\pm0.10$  &  $  7.6\pm  1.8$  &  % Tol 1434 Integr
                      $0.46\pm0.01$  &  $ 57.2\pm  0.8$  &  % Mrk 475  Knot A   
		      $0.47\pm0.03$  &  $ 46.1\pm  1.8$  \\ % Mrk 475  Integr
4363 & [\ion{O}{iii}]    &  
                      $0.07\pm0.01$  &  $  2.1\pm  0.5$  &  % Tol 1434 Knot A   
		      --            &  --              &  % Tol 1434 Knot B 
		      --            &  --              &  % Tol 1434 Knot CD  
		      --            &  --              &  % Tol 1434 Integr
                      $0.08\pm0.01$  &  $ 10.2\pm  0.6$  &  % Mrk 475  Knot A   
		      $0.09\pm0.02$  &  $  7.7\pm  1.6$  \\ % Mrk 475  Integr
4471 &  \ion{He}{i}      &
                      --            &  --              &  % Tol 1434 Knot A 
		      --            &  --              &  % Tol 1434 Knot B 
		      --            &  --              &  % Tol 1434 Knot CD  
		      --            &  --              &  % Tol 1434 Integr
                      $0.04\pm0.01$  &  $  4.6\pm  0.5$  &  % Mrk 475  Knot A  
		      --            &  --              \\ % Mrk 475  Integr
4686 &  \ion{He}{ii}      &
                      --            &  --              &  % Tol 1434 Knot A  
		      --            &  --              &  % Tol 1434 Knot B 
		      --            &  --              &  % Tol 1434 Knot CD
		      --            &  --              &  % Tol 1434 Integr
                      $0.03\pm0.01$  &  $  4.5\pm  0.7$  &  % Mrk 475  Knot A  
		      --            &  --              \\ % Mrk 475  Integr
4861 & H$\beta$          &  
                      $1.00\pm0.00$  &  $ 70.8\pm  0.9$  &  % Tol 1434 Knot A   
		      $1.00\pm0.00$  &  $ 49.0\pm  2.0$  &  % Tol 1434 Knot B 
		      $1.00\pm0.00$  &  $ 19.2\pm  1.3$  &  % Tol 1434 Knot CD  
		      $1.00\pm0.00$  &  $ 25.4\pm  1.4$  &  % Tol 1434 Integr
                      $1.00\pm0.00$  &  $143.5\pm  0.9$  &  % Mrk 475  Knot A   
		      $1.00\pm0.00$  &  $ 91.1\pm  2.3$  \\ % Mrk 475  Integr
4959 & [\ion{O}{iii}]    &  
                      $1.56\pm0.05$  &  $118.1\pm  1.3$  &  % Tol 1434 Knot A   
		      $1.46\pm0.08$  &  $ 86.9\pm  2.5$  &  % Tol 1434 Knot B 
		      $1.20 pm0.11$  &  $ 26.6\pm  1.6$  &  % Tol 1434 Knot CD  
		      $1.33\pm0.10$  &  $ 35.1\pm  1.5$  &  % Tol 1434 Integr
                      $1.73\pm0.04$  &  $258.1\pm  1.2$  &  % Mrk 475  Knot A   
		      $1.64\pm0.06$  &  $148.1\pm  2.6$  \\ % Mrk 475  Integr
5007 &  [\ion{O}{iii}]   &  
                      $4.58\pm0.13$  &  $307.3\pm  1.7$  &  % Tol 1434 Knot A   
		      $4.32\pm0.21$  &  $254.6\pm  3.7$  &  % Tol 1434 Knot B 
		      $3.37\pm0.27$  &  $ 73.1\pm  2.0$  &  % Tol 1434 Knot CD  
		      $3.98\pm0.25$  &  $104.4\pm  2.1$  &  % Tol 1434 Integr
                      $5.16\pm0.13$  &  $799.4\pm  2.1$  &  % Mrk 475  Knot A   
		      $4.93\pm0.18$  &  $411.5\pm  3.8$  \\ % Mrk 475  Integr
5876 &  \ion{He}{i}      &  
                      $0.12\pm0.01$  &  $  9.5\pm  0.9$  &  % Tol 1434 Knot A   
		      --            &  --              &  % Tol 1434 Knot B  
		      --            &  --              &  % Tol 1434 Knot CD   
		      --            &  --              &  % Tol 1434 Integr
                      $0.10\pm0.01$  &  $ 19.1\pm  0.4$  &  % Mrk 475  Knot A   
		      $0.10\pm0.01$  &  $  9.2\pm  0.9$  \\ % Mrk 475  Integr
6300 & [\ion{O}{i}]    &  
                      --            &  --              &  % Tol 1434 Knot A   
		      --            &  --              &  % Tol 1434 Knot B  
		      --            &  --              &  % Tol 1434 Knot CD  
		      --            &  --              &  % Tol 1434 Integr
                      --            &  --              &  % Mrk 475  Knot A   
		      --            &  --              \\ % Mrk 475  Integr
6548 &  [\ion{N}{ii}]    &  
                      $0.06\pm0.01$   &  $  7.4\pm  0.7$  &  % Tol 1434 Knot A   
		      $0.05\pm0.01$   &  $  3.7\pm  1.1$  &  % Tol 1434 Knot B  
		      --             &  --              &  % Tol 1434 Knot CD   
		      --             &  --              &  % Tol 1434 Integr
                      --             &  --              &  % Mrk 475  Knot A   
		      --             &  --              \\ % Mrk 475  Integr
6563 & H$\alpha$         &  
                      $2.86\pm0.11$   &  $340.0\pm  2.3$  &  % Tol 1434 Knot A   
		      $2.86\pm0.20$   &  $207.1\pm  3.4$  &  % Tol 1434 Knot B 
		      $2.86\pm0.31$   &  $ 94.2\pm  2.1$  &  % Tol 1434 Knot CD  
		      $2.86\pm0.26$   &  $102.5\pm  2.8$  &  % Tol 1434 Integr
                      $2.86\pm0.08$   &  $636.3\pm  1.8$  &  % Mrk 475  Knot A   
		      $2.83\pm0.12$   &  $347.1\pm  3.4$  \\ % Mrk 475  Integr 
6584 &  [\ion{N}{ii}]    &  
                      $0.12\pm0.01$   & $ 14.1\pm  0.8$  &  % Tol 1434 Knot A   
		      $0.13\pm0.02$   & $  9.3\pm  1.3$  &  % Tol 1434 Knot B 
		      $0.22\pm0.05$   & $  6.9\pm  1.3$  &  % Tol 1434 Knot CD  
		      $0.14\pm0.04$   & $  4.9\pm  1.2$  &  % Tol 1434 Integr
                      $0.09\pm0.01$   & $ 21.3\pm  0.6$  &  % Mrk 475  Knot A   
		      $0.09\pm0.01$   & $  9.9\pm  1.3$  \\ % Mrk 475  Integr 
6678 &  \ion{He}{i}      &
                      $0.04\pm0.01$   & $  4.7\pm  0.7$  &  % Tol 1434 Knot A   
		      --             &   --            &  % Tol 1434 Knot B  
		      --             &   --            &  % Tol 1434 Knot CD  
		      --             &   --            &  % Tol 1434 Integr
                      $0.03\pm0.01$   & $  7.2\pm  0.6$  &  % Mrk 475  Knot A   
		      $0.03\pm0.01$   & $  4.1\pm  1.0$  \\ % Mrk 475  Integr
6717 & [\ion{S}{ii}]     & 
                      $0.21\pm0.01$   & $ 23.8\pm  0.9$  &  % Tol 1434 Knot A   
		      $0.27\pm0.04$   & $ 19.6\pm  2.2$  &  % Tol 1434 Knot B 
		      $0.37\pm0.06$   & $ 11.0\pm  1.5$  &  % Tol 1434 Knot CD  
		      $0.28\pm0.05$   & $  9.7\pm  1.4$  &  % Tol 1434 Integr
                      $0.14\pm0.01$   & $ 32.8\pm  0.6$  &  % Mrk 475  Knot A   
		      $0.16\pm0.02$   & $ 24.0\pm  2.4$  \\ % Mrk 475  Integr
6731 & [\ion{S}{ii}]     & 
                      $0.15\pm0.01$   & $ 17.0\pm  0.8$  &  % Tol 1434 Knot A   
		      $0.19\pm0.03$   & $ 13.9\pm  2.2$  &  % Tol 1434 Knot B  
		      $0.24\pm0.05$   & $  7.2\pm  1.4$  &  % Tol 1434 Knot CD  
		      $0.22\pm0.05$   & $  7.9\pm  1.6$  &  % Tol 1434 Integr
                      $0.11\pm0.01$   & $ 26.0\pm  0.6$  &  % Mrk 475  Knot A  
		      $0.14\pm0.02$   & $ 21.2\pm  2.5$  \\ % Mrk 475  Integr
      &          &  
                    \multicolumn{2}{c}{$F(\Hb)= 103.3\pm 10.1 $} &   %Tol1434 knot1 ; knot A
                    \multicolumn{2}{c}{ $F(\Hb)=  21.6\pm  3.7 $} &   %Tol1434 knot2   ; knot B
                    \multicolumn{2}{c}{ $F(\Hb)=  24.5\pm  6.5 $} &   %Tol1434 knot3  ; knot CD
                    \multicolumn{2}{c}{$F(\Hb)= 255.9\pm 56.9 $} &   %Tol1434 inte
                    \multicolumn{2}{c}{ $F(\Hb)= 855.1\pm 40.6 $} &   %Mrk475 Nucl  
                    \multicolumn{2}{c}{$F(\Hb)=1189.1\pm100.8 $} \\  %Mrk475 inte  
    &          &              
		    \multicolumn{2}{c}{$\CHbeta= 0.119\pm0.041 $} &   %Tol1434 knot1 ; knot A
                    \multicolumn{2}{c}{ $\CHbeta= 0.040\pm0.072 $} &   
                    \multicolumn{2}{c}{ $\CHbeta= 0.131\pm0.111 $} &  
                    \multicolumn{2}{c}{$\CHbeta= 0.099\pm0.093 $} &   
                    \multicolumn{2}{c}{ $\CHbeta= 0.019\pm0.018 $} &  	          
                    \multicolumn{2}{c}{$\CHbeta= 0.018\pm0.034 $} \\  
		        &          &              
                    \multicolumn{2}{c}{$\EBV=0.082\pm0.028$} &     
                    \multicolumn{2}{c}{ $\EBV=0.028\pm0.049$} &     
                    \multicolumn{2}{c}{ $\EBV=0.091\pm0.077$} &     
                    \multicolumn{2}{c}{$\EBV=0.068\pm0.054$} &     
                    \multicolumn{2}{c}{ $\EBV=0.013\pm0.012$} &    	        
                    \multicolumn{2}{c}{$\EBV=0.012\pm0.024$} \\    
\hline
\end{tabular} 
\end{table}