\begin{table}%t7
%\centering
\par
\caption{\label{tab:results-f}Detectability of the moon depending on the sampling rate of the simulated light curves.}
     \begin{tabular}{p{2cm} p{1.6cm} r}
       \hline \hline \noalign{\smallskip}
       Sampling step size in \ensuremath{\theta_{E}} & 
       $f_{\rm sampled}$ per min & Detectability\\
      \hline\noalign{\smallskip}
         $\phantom{1}6\times10^{-4}$  & 1/15 & 30.6\% \\
         $\phantom{1}9\times10^{-4}$  & 1/22 & 26.8\% \\
        $12\times10^{-4}$  & 1/30 & 24.9\% \\
       \hline
  \end{tabular}\vspace*{-2mm}
\end{table}