\begin{table}%T5
\caption{\label{table:sed}Results of the SED fits.}
\small
%\centering
 
\begin{tabular}{c c c c c c c c c}
\hline\hline \noalign{\smallskip}
    & $M_{\rm tot}$ & $L_{\rm bol}$ & $T_{\rm cold}$ & $T_{\rm hot}$ &  &  & $M_{\rm tot}/L_{\rm bol}$\\ 
Source & [$M_{\odot}$] & [$10^3~L_{\odot}$] & [K] & [K] & $M_{\rm cold}/M_{\rm tot}$ & $L_{\rm cold}/L_{\rm bol}$ & [$M_{\odot}$/$L_{\odot}$]\\
\hline
IRAS~13037-6112 & 60 & 1.5 & 22 & 243 &~$\sim$$1$ & 0.90 & 0.04\\
IRAS~13039-6108 & 89 & 2.1 & 22 & 253 &~$\sim$$1$ & 0.87 & 0.04\\
\hline 
\end{tabular}  
\end{table}