\begin{table}%t9
\caption {\label{tab:thf}The transfer function of the susceptibility of FEM to temperature variations.}             % title of Table
%\centering
                          % used for centering table
\begin{tabular}{l r r r r}        % centered columns (4 columns)
\hline\hline                 % inserts double horizontal lines
\noalign{\smallskip}
 & \multicolumn{4}{c}{FEM\sc{ susceptibility}}\\
 & \multicolumn{4}{c}{T{\sc ransfer} F{\sc unction} cK/K}  \\
 & M-00 & M-01 & S-10 & S-11 \\    % table heading 
\hline                        % inserts single horizontal line
{\tt RCA18}  & --8.48 & --9.13 & --6.77 & --7.67 \\
{\tt RCA19}  & --9.43 & --9.28 & --1.20 & --9.49 \\
{\tt RCA20}  & --6.61 & --5.69 & --5.93 & --5.79 \\
{\tt RCA21}  & --3.01 & --1.85 & --0.770 & --0.930 \\
{\tt RCA22}  & 5.67 & 5.21 & 5.69 & 6.04 \\
{\tt RCA23}  & --2.07 & --4.41 & --4.07 & --3.92 \\
{\tt RCA24}  & --1.21  & --0.610 & --2.03  & --0.964 \\
{\tt RCA25}  & --1.51 & --1.33 & --2.87 & --2.21 \\
{\tt RCA26}  & --6.22 & --6.10 & --6.57 & --6.31 \\
{\tt RCA27}  & --1.68 & --1.05 & --3.64 & --3.06 \\
{\tt RCA28}  & --0.266 &--0.519 & --1.85 & --1.05 \\
\hline                        %inserts single line
\end{tabular}
\end{table}