\begin{table}%t4
\caption {\label{tab:isolation}Receiver basic properties. 
}             % title of Table
%\centering
                          % used for centering table
\begin{tabular}{l r r r r}        % centered columns (4 columns)
\hline\hline                 % inserts double horizontal lines
\noalign{\smallskip}
 & \multicolumn{4}{c}{I{\sc sol} (${\rm dB}$)}\\
 & \multicolumn{4}{c}{L{\sc inear} M{\sc odel}} \\
 & M-00 & M-01 & S-10 & S-11 \\    % table heading 
\hline                        % inserts single horizontal line
{\tt RCA18}  & --13.5	& --13.0	& --11.1	& --10.9 \\
{\tt RCA19}  & --15.5	& --15.9	& --15.3	& --13.9 \\
{\tt RCA20}  & --15.8	& --15.9	& --12.7	& --14.2 \\
{\tt RCA21}  & --13.0	& --12.4	& --10.1	& --10.4 \\
{\tt RCA22}  & --12.8	& --11.1	& --12.4	& --11.3 \\
{\tt RCA23}  & --12.6	& --11.8	& --13.3	& --14.3 \\
{\tt RCA24}  & --11.7  & --12.3 & --10.4 & --10.5 \\
             & (--13.3)	& (--13.6)& (11.6)& (--11.9)\\
{\tt RCA25}  & --10.8 	& --10.7 	& --12.0  & --11.5  \\
& (--14.6)	&(--14.4)	& (--15.5) & (--14.5) \\
{\tt RCA26}  &  --10.8  & --11.9 & --13.7 & --13.7 \\
&  (--9.7) &  (--10.4)& (--13.9)& (--14.0)\\
{\tt RCA27}  & --13.0 & --12.8 	& --14.7 	& --14.6 \\
&  (--11.2)	&  (--11.0)	&(--11.7)	& (--11.8)\\
{\tt RCA28}  & --10.9  & --10.3  & --10.3 & --10.5   \\
& (--11.6) &(--11.2) & (--12.0) & (--12.2)  \\
\hline                                   %inserts single line
\end{tabular}
\tablefoot{Isolation in dB. The values found during the $V_{g2}$ tuning are also reported in brackets for comparison.}
\end{table}