\begin{table}%t8
\par
      \caption{\label{tab:tnoise_gain_lin_results}Best-fit non-linear model parameters.}.
       %\centering
\par
        {       \begin{tabular}{cccccc}
\par
        \hline   
        \hline
        Rec. ID & Param. & M-00 & M-01 & S-10 & S-11 \\
        \hline   
                        & $b$          & $\ldots$  & $\ldots$  & $\la $$10^{-3}$  & $\la $$10^{-3}$  \\
        \textbf{LFI18} & $G_0$ (V/K)  & $\ldots$ & $\ldots$ & 0.026 & 0.022 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & $\ldots$ & $\ldots$ & 37.4 & 40.5 \\
\par
                        & $b$  & $\la$$ 10^{-3}$   & $\la $$10^{-3}$   & $\la $$10^{-3}$   & $\la$$ 10^{-3}$
  \\
        \textbf{LFI19} & $G_0$ (V/K)  & 0.020 & 0.021 & 0.016 & 0.018 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 39.8 & 38.7 & 37.5 & 40.0 \\
\par
                        & $b$  & $\la $$10^{-3}$  & $\la $$10^{-3}$   & $\la $$10^{-3}$   & 
	    $\la$$ 10^{-3}$ 
 \\
        \textbf{LFI20} & $G_0$ (V/K)  & 0.019 & 0.018 & 0.025 & 0.025 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 42.3 & 42.2 & 43.9 & 43.0 \\
\par
                        & $b$  & $\la $$10^{-3}$  & $\la $$10^{-3}$  & $\la$$ 10^{-3}$  & $\la$$ 10^{-3}$  
\\
        \textbf{LFI21} & $G_0$ (V/K)  & 0.025 & 0.023 & 0.016 & 0.014 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 31.9 & 34.6 & 43.3 & 45.9 \\
\par
                        & $b$  & $\la$$ 10^{-3}$  & $\la$$ 10^{-3}$   & $\la $$10^{-3}$  & $\la$$ 10^{-3}$ 
\\
        \textbf{LFI22} & $G_0$ (V/K)  & 0.011 & 0.012 & 0.014 & 0.016 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 40.5 & 38.9 & 40.8 & 43.5 \\
\par
                        & $b$  & $\la $$10^{-3}$   & $\la $$10^{-3}$   & $\la$$ 10^{-3}$   & $\la$$ 10^{-3}$
  \\
        \textbf{LFI23} & $G_0$ (V/K)  & 0.025 & 0.029 & 0.014 & 0.007 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 40.6 & 39.2 & 50.3 & 54.2 \\
\par
                        & $b$  & $\ldots$ & $\ldots$ & 1.43 & 1.43  \\
        \textbf{LFI24} & $G_0$ (V/K)  & $\ldots$ & $\ldots$ &  0.005 &   0.005  \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & $\ldots$ & $\ldots$ &  19.7 & 19.9 \\
\par
                        & $b$  &  1.21 &  1.16 &  0.79 & 1.00 \\
        \textbf{LFI25} & $G_0$ (V/K)  &  0.008 & 0.008 &   0.007 &  0.007 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 19.7 &  19.7 &  20.5 & 20.2 \\
\par
                        & $b$  &  1.07 & 1.40 & 0.93 & 1.21 \\
        \textbf{LFI26} & $G_0$ (V/K)  &  0.005 &  0.006  &    0.007 & 0.007\\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 20.2 &  19.1 &  18.5 &  18.1 \\
\par
                        & $b$  &0.12 & 0.12 & 0.12 & 0.14 \\
        \textbf{LFI27} & $G_0$ (V/K)  & 0.074 &    0.081 &   0.070 &   0.058 \\
        \vspace{.2cm}
                        & $T_{\rm noise}$ (K)  & 13.3 &  13.1 &  14.3  &  13.7 \\
\par
                        & $b$  & 0.19 &  0.16 & 0.19 & 0.19 \\
        \textbf{LFI28} & $G_0$ (V/K)  & 0.076 &   0.103 &   0.071 &    0.061 \\
                        & $T_{\rm noise}$ (K)  & 11.7 &  11.3 &  10.9 &  10.8 \\      
        \hline      
      \end{tabular}}
\par
 \tablefoot {Best-fit parameters have been obtained from the non-linear fit to data acquired during
instrument-level tests. The linearity factor was obtained by constraining it to be $\pm $1\% around the value found
during calibration of individual receivers \citep[see][]{2009_LFI_cal_R4}.}
    \end{table}