\begin{table}%t5
\caption{\label{tab:list_main_calibration_parameters}Main calibration parameters and where they have been/will be measured.}
\par
%\centering
\par
\begin{tabular}{llcccc}
\hline\hline\noalign{\smallskip}
         \textbf{Category} & \textbf{Parameters} & \textbf{RCA} & \textbf{RAA} & \textbf{SAT} & \textbf{FLI} \\
\hline
         \textbf{\textit{Tuning}} & FE LNAs &  Y & Y & Y & Y \\
                & FE PS & Y & Y & Y & Y \\
                & BE offset and gain & Y & Y & Y & Y \\
                & Quantisation/compression & N & Y & Y & Y \\
         \hline
         \textbf{\textit{Radiom.}}  & Photometric calibration & Y & Y & Y & Y \\
                & Linearity & Y & Y & Y & Y \\
                & Isolation & Y & Y & Y & Y \\
                & In-band response & Y & N & N & N \\
         \hline
         \textbf{\textit{Noise}}  & White noise & Y & Y & Y & Y \\
                & Knee freq.& Y & Y & Y & Y \\
                & 1/$f$ slope & Y & Y & Y & Y \\
         \hline
         \textbf{\textit{Susc.}} & FE temperature fluctuations & Y & Y & Y & Y \\
                        & BE temperature fluctuations & Y & Y & N & N \\
                        & FE bias fluctuations & Y & Y & N & N \\
\hline
\end{tabular}
\tablefoot {The following abbreviations have been used: SAT~= Satellite; FLI~= In-flight; FE~= Front-end; BE~= Back-end; LNA~= Low noise amplifier; PS~= Phase switch; Radiom~= Radiometric; and Susc~= Susceptibility.}
\end{table}