\begin{table}%t2
\caption{\label{MMS}Method of multiple subsets: groups of parameters allowed to converge for each model.}             
%\centering
\par
\begin{tabular}{c c c} 
\hline\hline \noalign{\smallskip}
Subset 1 & Subset 2 & Subset 3 \\ 
 & Detached systems &  \\
\hline
 ($e$) & $i$ & $T_{\rm S}$ \\
 $\Delta{\phi}$ & $\Omega_{\rm S}$ & $\Omega_{\rm P}$ \\
 $L_{\rm P}^{B, V, I}$ & ($\dot{\omega}$) & ($\omega_{0}$) \\ 
\hline
 & semi-detached and overcontact systems &  \\
 $\Delta{\phi}$ & $i$ & \\
 $L_{\rm P}^{B, V, I}$ & $\Omega_{\rm P}$ & \\ 
 $T_{\rm S}$ & & \\
\hline   
\end{tabular}
\end{table}