\begin{table}%ta1
%%\centering

\par
\caption{\label{tab:data}Log of the data used for the image reconstruction.}
\tiny\begin{tabular}{lllllll}
\hline \hline \noalign{\smallskip}
    Interferom. &Obs.\ &$B_P$ (m) &\# meas. & Band & Disp. &Refs. \\
    \hline
    KI    &2003    &72--78  &4    &$K$ &BB &M05\\
    IOTA  &2003--04 &10--28  &9   &$H$ &BB &M06\\
    CHARA &2004--07 &86--313 &16  &$K$ &BB &T08\\
    VLTI/ &\multirow{2}{*}{2008}  &\multirow{2}{*}{13--128}
    &947 &$K$ &\multirow{2}{*}{35} &\multirow{2}{*}{B10}\\
    ~AMBER & & &544 &$H$ & &\\
   \hline
\end{tabular}
\tablefoot{$B_P$ is the projected baselines; Disp. is the spectral dispersion.  References are M05 \citep{Monnier2005}, M06 \citep{Monnier2006},  T08 \citep{Tannirkulam2008}, B10 \citep{Benisty2010}.} 
 \end{table}