\begin{table}%t4
\caption{\label{tb:lowxvgerr}Reconstruction accuracy of the Low\_HFT equilibrium for different initial conditions.}
%%\centering

\par
\begin{tabular}{ccccc}
\hline \hline
\noalign{\smallskip}
Figure  & {Potential} &          & {Potential} & {Linear}        \\
of merit& {Schmidt}   & {TD\_ex} & {Seehafer}  & {Seehafer}      \\
\hline
$\sigma_J \times 10^{2} $ & 0.73    &  1.18    &  4.12    &  4.52     \\
$\langle~|f_i|~\rangle \times 10^{5}$ & 6.90    & 11.98    & 16.18    & 14.47     \\
$E_{\rm M}$            & 0.036   &  0.072   &  0.065   &  0.070    \\
HFT apex                  & 0.54\% &  1.05\% &  1.77\% &  2.06\%  \\
CFL apex                  & 0.63\% &  4.11\% & 13.93\% & 17.99\%  \\
$\Phi$                    & 1.10\% &  2.58\% &  2.26\% &  3.01\%  \\
$\tilde n  $              & 3.89\% &  2.45\% & 17.54\% & 36.88\%  \\
$E_{\rm mag}$          & 0.37\% &  1.49\% &  2.30\% &  2.26\%  \\
$H_{\rm mag}$          & 4.43\% &  7.58\% &  1.38\% &  6.86\%  \\
\hline
\end{tabular}
\end{table}