\begin{table}%t3
\par
\caption{\label{tb:potvgerr}Reconstruction accuracy of the stable TD equilibria.}
%%\centering

\par
\begin{tabular}{ccccc}
\hline \hline
\noalign{\smallskip}
Figure of merit  & {High\_HFT}  &   {Low\_HFT}   &  {No\_HFT} &{BP}\\
\hline
$\sigma_J \times 10^{2} $ & 1.55     &  0.73    &   1.18    &  0.80   \\
$\langle~|f_i|~\rangle \times 10^{5}$ & 6.04     &  6.90    &  10.28    & 10.05   \\
$E_{\rm M}$            & 0.044    &  0.036   &   0.033   &  0.054  \\
HFT apex                  & 1.94\%   &  0.54\%  &   \dots   &  \dots \\
CFL apex                  & 4.23\%   &  0.63\%  &   2.70\%  & 0.38\% \\
$\langle~\Phi~\rangle$  & 2.14\%   &  1.10\%  &   2.69\%  & 0.44\% \\
$\tilde n  $              & 3.92\%   &  3.89\%  &   6.61\%  & 0.51\% \\
$E_{\rm mag}$          & 0.22\%   &  0.37\%  &   0.74\%  & 0.03\% \\
$H_{\rm mag}$          & 4.55\%   &  4.43\%  &   4.83\%  & 2.80\% \\
\hline
\end{tabular}
\tablefoot {Figures of merit in the analysis domain as defined in Sect.~\ref{s:results}, with lower values indicating higher accuracy. Deviations from the corresponding values in the reference fields are given in percent. }
\end{table}