\begin{table}%t2
\caption {\label{tab3dcor}3D abundance corrections for several OH lines using 3D 
\cobold\ models with~6 and~12 opacity bins with the parameters 
$T_{\rm eff}[{\rm K}]/\log(g[{\rm cm~s}^{-2}])/[{\rm Fe}/{\rm H}]=6270/4/-3$ 
and $6240/4/-3$, respectively.}     
%\centering
\par
\begin{tabular}{lrrrrrrr}
\hline
\hline
\noalign{\smallskip}
Wavelength & $\chi$ & \tac$_{{\rm ,}6-{\rm bin}}$ & \tac$_{{\rm ,}12-{\rm bin}}$ & $\Delta_{6-12{\rm bin}}$ & \ftac$_{{\rm ,}6-{\rm bin}}$ & \ftac$_{{\rm ,}12-{\rm bin}}$ & $\Delta_{6-12{\rm bin}}$\\       
\noalign{\smallskip}
 [\AA] & [eV] & [dex] & [dex] & [dex] & [dex] & [dex] & [dex]\\       
\noalign{\smallskip}
\hline
\noalign{\smallskip}
3128.287 & 0.210 & --0.852 & --0.953 & 0.101 & --1.416 & --1.057 & --0.359 \\
3139.170 & 0.763 & --0.647 & --0.735 & 0.088 & --1.083 & --0.806 & --0.277 \\
3167.169 & 1.108 & --0.544 & --0.622 & 0.078 & --0.910 & --0.675 & --0.235 \\
\noalign{\smallskip}
\hline     
\end{tabular}
\end{table}