\begin{table}%t1
%
\par
%\centering
\par
\caption{\label{tab.1}{Parameters of the three blobs of the CM model whose SEDs are shown
 in Fig.\ref{sed_1275}.
 }} 
\begin{tabular}{*{9}{c}}
\hline\hline
\noalign{\smallskip}
 Component & $\log N(\mbox{cm}^{-3})$ & $p_1$ & $p_2$ & $\log \gamma_b$ & $B$ (G) & $\delta$ & $r$ (pc) & $z$\\
\hline
1 & --1.15 & 0.95 & 4.4 & 3.2 & 0.1 & 4.0 & 0.21  & 0.0179\\
2 & 0.83 & 1.2 & 3.5 & 3.7 & 0.1 & 8.0 & 0.008 & 0.0179\\
3 & 3.2  & 1.0 & 4.4 & 2.7 & 0.1 & 8.0 & 0.003 & 0.0179\\
\hline
 \end{tabular}
   \end{table}