\begin{table}%t1
%\centering
\par
\scriptsize
\caption{\label{tab:xtetimeresolved}Results of the  count-rate-resolved spectral analysis for the two \XMM\ observations 
of \xte.} 
\begin{tabular}{@{}lllllll@{}}
\noalign{\smallskip} 
\hline\hline
\noalign{\smallskip} 
 & \multicolumn{3}{c}{OBS1} & \multicolumn{3}{c}{OBS2} \\
cts/s & $<$0.1 & 0.1--0.4 & $>$0.4 & $<$0.1 & 0.1--0.4 & $>$0.4 \\
\hline
\noalign{\smallskip}
$N_{\rm H}$\tablefootmark{a} &  $\rm 2.9_{-0.6}^{+0.5}$ & 2.7  $\pm$  0.3 &  2.6  $\pm$  0.3 & $\rm 4.1_{-0.6}^{+0.7}$ & $\rm 3.2_{-0.2}^{+0.3}$ & 3.5  $\pm$  0.4 \\
\noalign{\smallskip}
$\Gamma$ &  1.8 $\pm$ 0.3 & 1.4 $\pm$ 0.1 & 1.1 $\pm$ 0.1 & 1.8 $\pm$ 0.3 &  1.2 $\pm$ 0.1 & 1.0 $\pm$ 0.1 \\
\noalign{\smallskip} 
$F_{\rm obs}$\tablefootmark{b} & $\rm 4.7_{-3.2}^{+0.9}$ &  $\rm 32.2_{-7.1}^{+3.4}$ & $\rm 123.8_{-20.7}^{+10.0}$ & $\rm 9.3_{-6.9}^{+1.2}$ & $\rm 42.0_{-7.6}^{+4.5}$ & $\rm 153.6_{-26.5}^{+13.7}$ \\
\noalign{\smallskip}
$\chi^2_{\rm red}$  & 1.08 & 1.11 & 1.00 & 0.74 & 1.04 & 1.00 \\
\noalign{\smallskip}
d.o.f.   & 33 & 93 & 105 & 34 & 132 & 89 \\ 
\noalign{\smallskip}
EXP.\tablefootmark{c} & 18 & 10 & 3 & 10 & 11 & 2 \\
\hline
\end{tabular}
\tablefoot{The model used to fit the data is an absorbed CUTOFFPL (we fixed the cutoff energy 
at 13~keV, see text for details).
\tablefoottext{a}{in units of 10$^{22}$~cm$^{-2}$.}
\tablefoottext{b}{Observed flux in the 0.5--10~keV energy band in units of 10$^{-13}$~erg~cm$^{-2}$~s$^{-1}$.} \tablefoottext{c}{Exposure time in ks.}}
\end{table}