\begin{table}%t1 
%\centering
\par
\caption {\label{DIRBEdata}Global emission from LMC and SMC.}
\begin{tabular}{cccc}
\hline\hline
\noalign{\smallskip}
Freq. & Wavel. & \multicolumn{2}{c}{Flux densities} \\
 $\nu$    & $\lambda$  & LMC  & SMC \\
\multicolumn{4}{c}{WMAP}\\
\hline
(GHz)     & (mm)       &\multicolumn{2}{c}{Jy}\\
\hline
 23  &    13    & 160~$\pm$~25 & 17~$\pm$~3  \\
 31  &     9.8  & 159~$\pm$~25 & 20~$\pm$~4  \\
 41  &     7.3  & 165~$\pm$~25 & 24~$\pm$~5  \\
 61  &     4.9  & 205~$\pm$~32 & 40~$\pm$~8  \\
 93  &     3.2  & 366~$\pm$~65 & 88~$\pm$~18 \\
\hline
\multicolumn{4}{c}{COBE-DIRBE} \\
(THz)     & ($\mu$m)   & \multicolumn{2}{c}{Jy}\\
\hline
  1.25 & 240    & 153~000~$\pm$~3000 & 12~350~$\pm$~1440 \\
  2.14 & 140    & 251~100~$\pm$~4500 & 18~900~$\pm$~2005 \\
  3.0  & 100    & 200~200~$\pm$~3000 & 15~750~$\pm$~2125 \\
  5.0  &  60    &  50~500~$\pm$~7500 &  7010~$\pm$~730  \\
 12.0  &  25    &   7520~$\pm$~1100 &   425~$\pm$~70   \\
 25.0  &  12    &   3450~$\pm$~600  &   235~$\pm$~35   \\
 61.2  &   4.9  &   1240~$\pm$~190  &   150~$\pm$~25   \\
 85.7  &   3.5  &   2190~$\pm$~300  &   280~$\pm$~40   \\
136.4  &   2.2  &   3765~$\pm$~540  &   525~$\pm$~65   \\
240.0  &   1.25 &   4520~$\pm$~650  &   670~$\pm$~80   \\
\hline
\end{tabular}
\end{table}