\begin{table}%t2
\caption{\label{table2}Mid-IR and X-ray observations (first ten entries).}
%\centerline
 {\begin{tabular}{lrrrrr}
\hline
\hline
\noalign{\smallskip}
Star                    & {\it Spitzer}& X-ray       & X-ray start time\tablefootmark{c}  &  X-ray stop time\tablefootmark{c}  & Total X-ray    \\
                        & AOR\tablefootmark{a}      & ObsID\tablefootmark{b}  & y-m-d h:m:s           &  y-m-d h:m:s	     & exposure\tablefootmark{c} (s) 	 	   \\
\hline
RNO~15                  & 5633280      & 0503670101  & 2007-07-31\ 04:55:25  & 2007-07-31\ 15:32:31  & 33~135	     \\ 	      
LkH$\alpha$~270         & 5634048      & 0065820101  & 2002-02-27\ 22:48:25  & 2002-02-28\ 12:41:45  & 44~808	    \\ 
LkH$\alpha$~271         & 11827968     & 0065820101  & 2002-02-27\ 22:48:25  & 2002-02-28\ 12:41:45  & 44~808	     \\       
LkH$\alpha$~326         & 5634304      & ...	     & ...		     & ...		     & ...	    \\       
LkH$\alpha$~327         & 5634560      & ...	     & ...		     & ...		     & ...	    \\       
LkH$\alpha$~330         & 5634816      & ...	     & ...		     & ...		     & ...	    \\       
IRAS 03446+3254         & 5635072      & ...	     & ...		     & ...		     & ...	    \\         
BP~Tau                  & 14548224     & 0200370101  & 2004-08-15\ 06:36:51  & 2004-08-16\ 18:42:57  & 116~334       \\
FM~Tau                  & 15119872     & 0203542001  & 2004-09-12\ 07:21:01  & 2004-09-12\ 15:47:38  & 26~760        \\	
T~Tau N                 & (VLT)	       & 0301500101  & 2005-08-15\ 14:14:33  & 2005-08-16\ 12:55:22  & 65~810	    \\
\hline                  
\end{tabular}}
\par
\tablefoot {\tablefoottext{a}{{\it Spitzer} AOR = Astronomical Observation Request; for further details on observing setup, see references in Table~\ref{table3}.}
\tablefoottext{b}{{\it XMM-Newton} observation identification number if not otherwise noted; {\it Chandra} ID if ``(CXO)'' added.}
\tablefoottext{c}{Exposure start and stop times for the {\it XMM-Newton} EPIC pn camera if not otherwise noted; if (M1), (M2), (M) added, then MOS1, MOS2, or both
     MOS were used for analysis, and exposure times refer to those detectors; (+M12) indicates that MOS detectors were
     used additionally to PN for spectral analysis. Exposure times in last column are livetimes for CCD\#1  of {\it XMM-Newton} camera (CCD containing aimpoint of observation for {\it Chandra}) and
   are only detector and are only 
     indicative as intervals with high background were selectively and additionally flagged.}}
\end{table}