\begin{table}%t1
\caption{\label{tab:best_fit_cop_90}Best Newtonian fit S1 for the HD~202206 system assuming $i_\sb=i_\sc=90\degr$  and $\Delta\Omega=0\degr$.}
\par
%\centering
\par
\begin{tabular}{llcc}
  \hline\hline \noalign{\smallskip}
    Param. & S1 & Inner & Outer \\
  \hline \noalign{\smallskip}
    $V_0$ & [km~s$^{-1}$] & \multicolumn{2}{c}{$14.729 \pm 0.001$} \\
    $P$ & [days] &  $256.389 \pm 0.044$ & $1397.445 \pm 19.056$ \\
    $K$ & [m/s] &  $564.82 \pm 1.42$ & $38.08 \pm 1.21$ \\
    $e$ & & $0.431 \pm 0.001$ & $0.104 \pm 0.024$ \\
    $\omega$ & [deg] & $161.91 \pm 0.27$ & $105.56 \pm 15.77$ \\
    $M+\omega$ & [deg] & $239.016 \pm 0.13$ & $250.38 \pm 2.71$ \\
  \hline
    $a$ & [AU] & 0.8053 & 2.4832 \\
    $i$ & [deg] & 90 & 90 \\
    $\Omega$ & [deg] & 0 & 0 \\
    $m$ & [${M}_{\rm Jup}$] & 16.59 & 2.179 \\
  \hline
    Date & [JD-2~400~000] & \multicolumn{2}{c}{53~000.00} \\
    rms  & [m/s] & \multicolumn{2}{c}{7.4544} \\
    $\rsc$ & & \multicolumn{2}{c}{1.411} \\[2pt]
  \hline
\end{tabular}
\tablefoot {Errors are given by the standard deviation~$\sigma$. This fit corresponds to a coplanar system seen edge-on, with minimum values for the~masses.}
\end{table}