\begin{table}%t4
%\centering
\par
\caption{\label{gauss_param}Integrated flux and full width at half maximum ({\it FWHM}) of the Gaussians used to model the emission of the sources A and B at 1.3 and 3 mm.} 
\begin{tabular}{lllll} \hline  \hline 
            &   &1.3~mm        &  &3~mm           \\ \hline
Source   & F$_{\nu}$(Jy)   & {\it FWHM}($''$) &  $F_{\nu}$(Jy) & {\it FWHM}($''$) \\ \hline
A        & 0.49    & 1.18     & 0.16   & 1.62     \\ 
B        & 0.97    & 0.86     & 0.25   & 0.78      \\ \hline 
\end{tabular}\vspace*{-1.2mm}
\end{table}