\begin{table}%t3
\caption{\label{results}Source fluxes obtained from SPIRE and PACS photometry plus previously derived MIPS fluxes.}
%\centering
\par
\begin{tabular}{llrcc}
\hline \hline \noalign{\smallskip}
Target   & Instrument       & $\lambda_{\rm ref}$ & FD [mJy] & Error [mJy] \\
\hline
Makemake & MIPS  & 24         &  0.30    & 0.02 \\
         & MIPS  & 71         & 14.6     & 2.2 \\
         & PACS  & 70         & 11.4     & 2.7 \\
         & PACS  & 100        & 12.0     & 2.8 \\
         & PACS  & 160        & 16.7     & 3.5 \\
         & SPIRE & 250        & 9.5      & 3.1 \\                
         & SPIRE & 350        & 7.1      & 1.8 \\
         & SPIRE & 500        & $<$8.8   &     \\
Orcus    & MIPS  &  24        &  0.33    & 0.03 \\
         & MIPS  &  71        & 26.6     & 2.2 \\
         & SPIRE & 250        & 12.3     & 2.3 \\
         & SPIRE & 350        & 6.6      & 1.7 \\
         & SPIRE & 500        & $<$10.7  &     \\
\hline
\end{tabular}
\end{table}