\begin{table}%T2
\caption{\label{llf-values.tab}Monochromatic and IR~bolometric LLFs ($0 < z < 0.2$). $L$ indicates $\nu~L_\nu$ for the monochromatic LLF and $L_{\rm IR}$ for the IR~bolometric LLF. }
\small%\centering
\par
\begin{tiny}
\begin{tabular}{ccccc}
\hline\hline\noalign{\smallskip}
$\log L$ & $\log~(\phi,\sigma)_{250}$ & $\log~(\phi,\sigma)_{350}$ & $\log~(\phi,\sigma)_{500}$ & $\log~(\phi,\sigma)_{\rm IR}$ \\\noalign{\smallskip}
\hline
  7.5  &            --           &           --            & --1.80,  --2.69 &           --  \\
  8.0  & --1.97,  --2.27 &           --            & --2.12,  --2.16 &           --  \\
  8.5  & --2.23,  --2.63 & --2.22,  --2.92 & --2.84,  --2.92 &           --  \\
  9.0  & --2.19,  --3.00 & --2.54,  --3.05 & --3.36,  --3.56 & --2.15, --3.00 \\
  9.5  & --2.38,  --4.50 & --3.14,  --3.57 & --4.88,  --6.14 & --2.19, --2.61 \\
 10.0 & --3.14,  --4.28 & --4.66,  --4.80 &           --            & --2.30, --2.72 \\
 10.5 & --4.62,  --5.23 &           --             &           --           & --2.49, --3.16 \\
 11.0 &           --            &           --             &           --          & --3.21, --3.95 \\
 11.5 &           --            &           --             &           --           & --4.24, --4.65 \\
\hline
\end{tabular}
\end{tiny}\vspace*{-2mm}
\tablefoot{$L$ at the bin centers are expressed in $L_\odot$ while LLF estimates and their errors are in ${\rm [Mpc^{-3}~dex^{-1}]}$.}
\end{table}