\begin{table}%t3
\caption{\label{table:3}Column densities along the cut.}
\par
\begin{tabular}{l l l c} 
\hline\hline \noalign{\smallskip}
Position & $^{13}$CO ($\rm 10^{15}~cm^{-2}$) & CH$^+$($\rm 10^{12}~cm^{-2}$) & CH($\rm 10^{12}~cm^{-2}$) \\ 
\hline \noalign{\smallskip}
A & $\rm1.2(85~K)^{1.3(200~K)}_{5.6(50~K)}$ & $\rm2.2(85~K)^{3.8(200~K)}_{1.9(50~K)}$	&  \\  
B & $\rm4.8(85~K)^{3.1(200~K)}_{13.8(50~K)}$ 		& $\rm2.2(85~K)^{3.8(200~K)}_{1.9(50~K)}$	&  \\ 
C & $\rm67.4(85~K)^{43.5(200~K)}_{191.7(50~K)}$ 	& $\rm6.4(85~K)^{11(200~K)}_{5.5(50~K)}$	& $\rm\leq$$4.5(85~K)^{8.4(200~K)}_{3.6(50~K)}$ \\ 
D & $\rm6.7(85K)^{4.3(200~K)}_{19.1(50~K)}$ 		& $\rm2.0(85~K)^{3.4(200~K)}_{1.7(50~K)}$	&  \\ 
\hline 
\end{tabular}
\tablefoot{The angular size assumes a filled Gaussian beam of 36$''$ at CO, CH$^+$ transition frequencies and 33.9$''$ at CH ones.}
\vspace*{-3mm}
\end{table}