\begin{table}%t1
\caption{\label{tab:candidates}The two H-ATLAS blazars found by cross-matching with the FIRST catalog.}
%
\par
%\centerline
{\small
\begin{tabular}{lccccccc}
\hline\hline
\multicolumn{1}{c}{H-ATLAS} & \multicolumn{1}{c}{$\Delta$} & \multicolumn{1}{c}{$S_{1.4~{\rm GHz}}$} & \multicolumn{1}{c}{$S_{500~\mu{\rm m}}$} & \multicolumn{1}{c}{$S_{350~\mu{\rm m}}$} & \multicolumn{1}{c}{$S_{250~\mu{\rm m}}$} & \multicolumn{1}{c}{$S_{170~\mu{\rm m}}$} & \multicolumn{1}{c}{$S_{100~\mu{\rm m}}$} \\
\multicolumn{1}{c}{name} & \multicolumn{1}{c}{arcsec} & \multicolumn{1}{c}{mJy} & \multicolumn{1}{c}{mJy} & \multicolumn{1}{c}{mJy} & \multicolumn{1}{c}{mJy} & \multicolumn{1}{c}{mJy} & \multicolumn{1}{c}{mJy} \\ \hline
J090910.1+012135\tablefootmark{a} & 0.3 & 571.7 & $265.8 \pm 8.9$& $193.8\pm 7.2$ & $159.6\pm 6.4$ & $105.4\pm 26.5$ & $137.3\pm 26.5$ \\
J090940.3+015957\tablefootmark{b} & 10.3 & 317.5 &  $68.2\pm 9.1$ &  $55.0\pm 7.2$ &  $35.5\pm 6.4$ & $<$$76.2$ & $<$79.5 \\ \hline
\end{tabular}}
\tablefoot{Coordinates (RA and Dec) refer to the H-ATLAS source.  $\Delta$ (arcsec) is the angular separation between FIRST and \textit{Herschel} positions. The quoted errors in \textit{Herschel} fluxes are statistical only. Calibration errors are estimated to be $\sim$15\% for SPIRE (Swinyard et~al. 2010), $\sim$10\% at $100~\mu$m, and  $\sim$20\% at $160~\mu$m. Upper limits are at the 3$\sigma$ level.\tablefoottext{a}{[HB89] 0906+015,} \tablefoottext{b}{PKS 0907+022.}}\vspace*{-2mm}
\end{table}