\begin{table}%t2
%\centering
\par
\caption{\label{tab:tabCIB}Resolved CIB surface brightness for Abell~2218,
and combined with the COSMOS contribution in the higher flux range (``PEP'').}
\begin{tabular}{l c c c c}
\hline\hline \noalign{\smallskip}
&  Flux-range &   CIB & d(CIB) & Fraction   \\
&  (mJy) & (nW m$^{-2}$~sr$^{-1}$) & & (\%) \\
\hline
100~$\mu$m A2218 &  0.94--35	&  7.9	& 3.4	& 55 $\pm$ 24  \\
100~$\mu$m PEP   &  0.94--142	& 8.8 	& 3.5	& 62 $\pm$ 25  \\
\hline
160~$\mu$m A2218 &  1.47--36 &  9.9 & 3.9 & 77 $\pm$ 31 \\
160~$\mu$m PEP   &  1.47--179	& 11.3 & 4.1 &     88 $\pm$ 32  \\
\hline
\end{tabular}
\end{table}