\begin{table}%t1
%\centering
\par
\caption{Integrated line fluxes\tablefootmark{1} ($10^{-15}$~Wm$^{-2}$).}
\vspace*{-2mm}
\begin{tabular}{cccccc}
\hline \hline \noalign{\smallskip}
Position & [OI] & [OIII] & [NII] & [CII] & [NII]\\
& 63~$\mu$m & 88~$\mu$m & 122~$\mu$m & 158~$\mu$m & 205~$\mu$m\\
\hline
Nucleus & 3.5 & 0.7 & 2.0 & 9.0	& 0.15\\ 
Enuc S & 0.28 & 0.13 & 0.07 & 1.2 & --\\
Enuc N & -- & -- & -- & 0.9 & --\\
\hline
\end{tabular}
\vspace*{-2mm}
\tablefoot{\tablefoottext{1}{``Nucleus'' comprises a circular region of $23\farcs8$ in radius ($\sim$2~kpc) centered on the Seyfert nucleus. The fluxes for the other positions were measured over the whole maps ($50\arcsec \times 50\arcsec \sim$$4 \times 4$~kpc). All measured fluxes have an uncertainty of~30\%.}}
\vspace*{-4mm}
\end{table}