\begin{table}%t1
\caption{\label{tab1}Results of the SED fitting.}\vspace*{-1.5mm}
\small%\centering
\par
\begin{tabular}{l r c c c}
  \hline\hline\noalign{\smallskip} 
  & $M_{\rm star}$  & 
   $\dot{M}_{\rm envelope}$ & $M_{\rm envelope}$ & $L$ \\
     & ($M_{\odot}$)  & (10$^{-3}~M_{\odot}$~yr$^{-1}$) & ($M_{\odot}$)&  (10$^3$~$L_{\odot}$) \\
  \hline
Cond.~1 &  20--30 & 8--10 & 5000  & 50\\
Cond.~2 & 8--10  & 4 & 8 & 1  \\
Cond.~3 & 8--15 & 2--5 & 2000--5000 & 2--5  \\
\hline
\end{tabular}\vspace*{-3mm}
\end{table}