\begin{table}%t1
\caption{\label{tab1}H-ATLAS galaxy counts. }\vspace{-2mm}
\small%\centering
\par
\begin{tabular}{ccccc}
 \hline\hline\noalign{\smallskip}
Flux&No. of&Flux&Int. Counts $N$($>$$S$) &Diff. Counts\\
(mJy)&Galaxies&Correction&per sq. deg.&gal. sr$^{-1}$Jy$^{1.5}$\\\hline  \noalign{\smallskip}
\multicolumn{5}{c}{250~$\mu$m}\\ \hline
      800&	10&		1  &0.7~$\pm$~0.2& 2200~$\pm$~700\\
     450&	4&		1  &1~$\pm$~0.3&1200 ~$\pm$~600\\
      350&	14&		1  &2~$\pm$~0.4&2300~$\pm$~600\\
     250&	16&		1  &3~$\pm$~0.5&1100~$\pm$~300\\
     175&	25&		1  &5~$\pm$~1.0&1500~$\pm$~300\\
     125&	115&	1 &10~$\pm$~1.0&2900~$\pm$~300\\
     93&	 69&		1  &20~$\pm$~1&4200~$\pm$~500\\
    83&	126&	1  &25~$\pm$~2&5700~$\pm$~500\\
    73&	 232&	1  &45~$\pm$~2&7600 ~$\pm$~500\\
    63&	418&	1  &70~$\pm$~2&9600 ~$\pm$~500\\
    56&	345&	1  &100~$\pm$~3&12000 ~$\pm$~650\\
    52&	506&	1  &150~$\pm$~5&14000~$\pm$~600\\
    47&	710&	1  &200~$\pm$~5&16000~$\pm$~600\\
    42&	1093&	1  &300~$\pm$~5&18500 ~$\pm$~600\\
    38&	1702&	1&374~$\pm$~5&21500 ~$\pm$~500\\\hline
    34&	898&	1.1&436~$\pm$~6&23000~$\pm$~800\\ 
  \noalign{\smallskip}
\multicolumn{5}{c}{350~$\mu$m}\\\hline
\noalign{\smallskip}
 700&	7&	1&0.5~$\pm$~0.2&800~$\pm$~300\\
 250&	8&	1&1.0~$\pm$~0.3&600 ~$\pm$~200\\
 175&	8&	1&1.6~$\pm$~0.3&500~$\pm$~200\\
 125&	27&	1&3.5~$\pm$~0.5&700~$\pm$~150 \\
 91&		16&	1&4.6~$\pm$~0.5&900~$\pm$~250\\
 82&		43&	1&7.6~$\pm$~1&2000~$\pm$~300\\
 71&		92&	1&14.0~$\pm$~1&2800~$\pm$~ 300\\
  61&195&	 1&28~$\pm$~1&4200~$\pm$~300\\
 55&	158&	1&39~$\pm$~2&5000~$\pm$~ 400 \\
 50&	256&	1&56~$\pm$~2& 6600~$\pm$~400\\
46&	458&	1&88~$\pm$~3&9400~$\pm$~ 450\\ 
41&	669&	1&134~$\pm$~3&11~000~$\pm$~400\\
38&	594&	1&176~$\pm$~4&13~000~$\pm$~550\\\hline
  \noalign{\smallskip}
\multicolumn{5}{c}{500~$\mu$m}\\\hline
\noalign{\smallskip}
250	&4	&	1&0.28~$\pm$~0.15&285~$\pm$~150\\
150	&7	&	1&0.76~$\pm$~0.25&140~$\pm$~50\\
 95	&3	&	1&0.97~$\pm$~0.3&190~$\pm$~100\\
 82&13	&	1&1.88~$\pm$~0.4&370~$\pm$~100\\
 70&26	&	0.89&3.68~$\pm$~0.5&580~$\pm$~100\\
 63&16	&	0.84&4.79~$\pm$~0.6&580~$\pm$~150\\
 60&19	&	0.82&6.11~$\pm$~0.7&760~$\pm$~200\\
 56&43	&	0.82&9.1~$\pm$~0.8&1100~$\pm$~200\\
 52&76	&	0.83&14.4~$\pm$~1.0&1300~$\pm$~150\\
 48&50	&	0.84&17.8~$\pm$~1.0&1900~$\pm$~300\\ 
 \hline
\end{tabular}\vspace*{-2mm}
\tablefoot{Correction column gives the effective flux correction factor required to match the output to 
input counts from the simulations, and the fluxes quoted are after correction.}
\vspace*{-3.5mm}
\end{table}