\begin{table}%t2
%\centering
\par
\caption{\label{besttable}Model results and their uncertainties for the warm gas.}
\begin{tabular}{l c l}
\hline\hline \noalign{\smallskip}
Quantity  &  Most probable value  & Range\tablefootmark{\dagger} \\ 
\hline
$T_{\rm kin}$ (K)  & 545 & 350--825 \\
${\rm Log}_{10}~n({{\rm H}_2})$~(cm$^{-3}$) & 3.7   & 3.0--4.1 \\
Log$_{10} N(^{12}$CO) (cm$^{-2}$) & 19.0 & 18.5--19.8\\
${\rm Log}_{10}~\Phi_{A}N(^{12}$CO)\tablefootmark{\dagger} (cm$^{-2})$ & 17.4 & 17.2 -- 17.9 \\
$N(^{12}$CO)/$N(^{13}$CO)   & $ 20 $ & $15 - 37$ \\
Log$_{10} P$ (K~cm$^{-3}$) & 6.4 & 5.8--6.7\\
$M_{\rm gas}$ ($\times 10^{7}~M_{\sun}$) & 1.2  &  0.7--3.6  \\ 
\hline
\end{tabular}
\tablefoot{\tablefoottext{\dagger}{Ranges are for~95\% confidence intervals;}
\tablefoottext{\dagger \dagger}{Beam averaged column density where $\Phi_{{\rm A}}$ is an area filling factor.}}
\vspace*{2mm}\end{table}