\begin{table}%t1
\caption{\label{t_lines}Summary of the PACS targeted lines and the CO~lines observed with the SMA (Raman et~al. \cite{raman2006}; Pani\'c et~al. \cite{panic2008}).}\vspace*{-2mm}
\par
%\centering
\par
\begin{tabular}{rcccc}
    \hline\hline \noalign{\smallskip}
Species       &                       Transition                         & $\lambda_{\rm c}$   & Continuum     & Line Flux\\
                      &                                                                 & (\mic)                   &      (Jy)              & (10$^{-18}$ W/m$^{2}$)\\
\hline \noalign{\smallskip}   
[OI]                 & $\rm ^3P_1 \rightarrow \ ^3P_2$            & 63.18                 & 18.89 (0.13)     &71.7 (3.8)\\
\par
[OI]                 & $\rm ^3P_0 \rightarrow \  ^3P_1$            & 145.53               & 13.76 (0.03)   &${<}10.4$ \\  
\par
[CII]                & $\rm ^2P_{3/2} \rightarrow \ ^2P_{1/2}$ & 157.74               & 14.48 (0.03)   &${<}6.4$   \\   
o-\water   \    & 2$_{12} \rightarrow 1_{01}$             & 179.53               & 13.12 (0.05)     &${<}8.8$   \\  
o-\water   \    & 4$_{23} \rightarrow 3_{12}$             & 78.74                 &  17.82 (0.32)    &${<}10.6$ \\  
CO                 & 36 $\rightarrow$ 35                            & 72.84                &  17.92 (0.04)    &${<}15.5$ \\  
CO                 & 29 $\rightarrow$ 28                            & 90.16                &  17.00 (0.05)    &${<}10.6$ \\  
\hline \noalign{\smallskip}
  $^{12}$CO & 2 $\rightarrow$ 1                                & 1300.40             & 0.169 (0.005)   &  0.093 (0.004)\\
  $^{13}$CO & 2 $\rightarrow$ 1                                & 1360.22             & 0.169 (0.005)   &  0.048 (0.004)\\
\hline
\end{tabular}\vspace*{-2mm}
\tablefoot {We list the central wavelength, continuum and line flux or upper limits (three sigma) in the case of a non-detection. Between brackets we give the one sigma statistical error for the detections.}\vspace*{-2mm}
\end{table}