\begin{table}%t3
 \caption{\label{tab:3c318-par}Parameters for 3C~318 at 4.8~GHz with a
resolution of $35 \times 33$~mas$^{2}$ at 46${\degr}$. 
}
\small%\centering
\par
 \begin{tabular}{cccccc}
 \hline
 \hline\noalign{\smallskip}
Comp.    & $S_{\rm tot}$ & $S_{\rm peak}$ & $S_{\rm pol}$  &  $m$  & EVPA       \\
         & mJy       & mJy        & mJy        &  \%   & deg        \\
\hline 
K1       &     35.2 &  16.4      &   0.8       &  2.2  &  $72\pm5$   \\
K2       &    228.4 & 122.2      &   8.0       &  3.5  &  $69\pm5$   \\
K3       &     47.9 &  9.8       &             &       &             \\
K3       &     47.9 &  9.8       &             &       &              \\
K4       &     15.0 &  5.9       &             &       &              \\
K5       &     34.7 &  9.9       &             &       &              \\
A        &    107.5 & 16.8       &             &       &              \\
\hline
\end{tabular}
\tablefoot{The rms noise ($1\sigma$) is 0.1 and 0.08~mJy/b for total and polarised 
flux density measurements, respectively.}
\end{table}