\begin{table}%t2
 \caption{\label{tab:fluxes}Polarimetric parameters for the  inner jet of 3C~119.}
 \small%\centering
\par
 \begin{tabular}{ccccccccc}
 \hline
 \hline\noalign{\smallskip}
Comp. A & &          &           &              &          &               &       &\\
%\hline 
IFs    &      & $S_{\rm tot}$ & $S_{\rm peak}$ &rms($1\sigma$)& $S_{\rm pol}$& rms($1\sigma$)&  $m$  & EVPA  \\
       & MHz  & mJy      & mJy/b       & mJy/b        & mJy      & mJy/b         &  \%   & deg   \\
\hline
IF1    & 4619 &  93.7    &  93.2     &   0.7        & $<$0.6   &   0.11        &$<$0.6 &          \\      
IF2    & 4657 &  92.0    &  92.0     &   0.6        &$\sim$0.9 &   0.11        &$\sim$1& $\sim$0  \\
IF3    & 4854 &  95.0    &  89.4     &   0.6        & $<$0.6   &   0.12        &$<$0.6 &          \\
IF4    & 5094 &  90.5    &  90.5     &   0.6        & $<$0.7   &   0.13        &$<$0.7 &          \\
       &      &          &           &              &          &
 &   &   \\
IF1--4 & 8409 &  70.0    &  69.4     &   0.1        &          &   0.1         &       &       \\
\noalign{\smallskip}
Comp.B & &          &           &              &          &               &       &   \\
IF1    & 4619 &  251.3   &  216.3    &   0.7        &  1.7     &   0.11        & 0.7   & $73\pm2$      \\      
IF2    & 4657 &  267.2   &  207.1    &   0.6        &  1.4     &   0.11        & 0.5   & $62\pm1$      \\
IF3    & 4854 &  272.0   &  211.2    &   0.6        &  1.8     &   0.12        & 0.7   & $59\pm3$      \\
IF4    & 5094 &  273.8   &  199.2    &   0.6        &  1.6     &   0.13        & 0.6   & $44\pm6$      \\
      & & & & &  &    & & \\
IF1--4 & 8409 &  155.6   &  134.2    &   0.1        &  0.8     &   0.09        & 0.5   &  $-77\pm5$      \\ 
\noalign{\smallskip}
Comp.C & &          &           &              &          &               &       &\\ 
IF1    & 4619 &  1831.4  &  1255.7   &   0.7         &  19.6   &   0.11        & 1.1   & $105\pm2$      \\      
IF2    & 4657 &  1827.6  &  1204.3   &   0.6         &  24.2   &   0.11        & 1.3   & $92\pm6$      \\
IF3    & 4854 &  1819.7  &  1229.1   &   0.6         &  24.3   &   0.12        & 1.3   & $62\pm6$      \\
IF4    & 5094 &  1800.8  &  1157.2   &   0.6         &  22.1   &   0.13        & 1.2   & $40\pm5$      \\
  & &   &  &  & & & & \\
IF1--4 & 8409 &  1121.4  &   806.2   &   0.1         & 161.1   &   0.09        &14.4   & $61\pm2$      \\ 
\hline
\end{tabular}
\tablefoot{The values for the three brightest components along the core-jet structure
are organised as follows: 
Col.~1, IF number; 2, observing frequency; 
3,~total flux density; 4, peak flux density; 
5,~1$\sigma$ rms noise;
6,~polarised flux density; 7,~1$\sigma$ rms noise;
8,~percentage polarisation; 9,~electric vector
position angle.} 
\vspace*{2mm}
\end{table}